TABLE 4 BIRCH–SWINNERTON-DYER DATA

In Table 4 we give the numbers relating to the Birch–Swinnerton-Dyer conjecture, for each “strong Weil” curve E_{f}. Each curve is identified as before with a single letter X after the conductor, and is^{1} the curve NX1 of Table 1.

For each curve we first give the rank r , and then list (to 10 decimal places): the real period Ω(f), the value of L^{(r)}(f, 1)/r!, the regulator R of E_{f}, and the ratio L^{(r)}(f, 1)/r!RΩ. For curves of rank 0 we obviously have R = 1 exactly; also the ratio L(f, 1)/Ω(f) is known exactly in these cases, so we give it as an exact rational rather than as a decimal. Finally we give the value of

S = \frac{L^{(r)}(f, 1)}{r! Ω(f)} /\frac{(∏ c_{p}) R}{|T |^{2}} ,

which according to the Birch–Swinnerton-Dyer conjecture should equal the order of the Tate– Shafarevich group � (E_{f}/ℚ). The value S is known exactly in case r = 0 and approximately in case r > 0; in each case it is a positive integer to within 10 decimal places, and is (to this precision) equal to 1 in all but 4 cases. The exceptions are

S = 4  for 571A, 960D, and 960N;
S = 9  for 681B.

These are all curves of rank 0, so that the value of S is exact.

We have also computed the corresponding data for all the curves in each isogeny class, but this extra data is not included here for reasons of space. For a summary of the results obtained, see [16]. As well as S = 1, 4 and 9, the values S = 16, 25 and 49 were also obtained, all for curves of rank 0.

1As remarked earlier, for class 990H the “strong” curve is 990H3 and not 990H1, and so the data here is for the curve 990H3.

Curve  r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
11A(B) 0 1.2692093043 0.2538418609  1  1/5  1
14A(C) 0 1.9813419561 0.3302236593  1  1/6  1
15A(C) 0 2.8012060847 0.3501507606  1  1/8  1
17A(C) 0 1.5470797536 0.3867699384  1  1/4  1
19A(B) 0 1.3597597335 0.4532532445  1  1/3  1
20A(B) 0 2.8243751420 0.4707291903  1  1/6  1
21A(B) 0 3.6089232431 0.4511154054  1  1/8  1
24A(B) 0 4.3130312950 0.5391289119  1  1/8  1
26A(B) 0 1.5467299538 0.5155766513  1  1/3  1
26B(D) 0 4.3467574468 0.6209653495  1  1/7  1
27A(B) 0 1.7666387503 0.5888795834  1  1/3  1
30A(A) 0 3.3519482592 0.5586580432  1  1/6  1
32A(B) 0 2.6220575543 0.6555143886  1  1/4  1
33A(B) 0 2.9893565910 0.7473391477  1  1/4  1
34A(A) 0 4.4956633263 0.7492772211  1  1/6  1
35A(B) 0 2.1087337174 0.7029112391  1  1/3  1
36A(A) 0 4.2065463160 0.7010910527  1  1/6  1
37A(A) 1 5.9869172925 0.3059997738 0.0511114082 1.0000000000 1.0
37B (C) 0 2.1770431858 0.7256810619  1  1/3  1
38A(D) 0 1.8906322299 0.6302107433  1  1/3  1
38B(A) 0 4.0962281653 0.8192456331  1  1/5  1
39A(B) 0 3.3067514027 0.8266878507  1  1/4  1
40A(B) 0 2.9688249468 0.7422062367  1  1/4  1
42A(A) 0 3.4754474575 0.8688618644  1  1/4  1
43A(A) 1 5.4686895300 0.3435239746 0.0628165071 1.0000000000 1.0
44A(A) 0 2.4139388627 0.8046462876  1  1/3  1
45A(A) 0 1.8431817533 0.9215908766  1  1/2  1
46A(A) 0 1.3218082226 0.6609041113  1  1/2  1
48A(B) 0 3.3715007096 0.8428751774  1  1/4  1
49A(A) 0 1.9333117056 0.9666558528  1  1/2  1
50A (E) 0 2.1394949443 0.7131649814  1  1/3  1
50B(A) 0 4.7840561329 0.9568112266  1  1/5  1
51A(A) 0 2.5801770484 0.8600590161  1  1/3  1
52A(B) 0 1.6909664173 0.8454832086  1  1/2  1
53A(A) 1 4.6876410489 0.4358638242 0.0929814846 1.0000000000 1.0
54A (E) 0 2.1047244760 0.7015748253  1  1/3  1
54B(A) 0 3.0915655491 1.0305218497  1  1/3  1
55A(B) 0 4.1146794247 1.0286698562  1  1/4  1
56A(C) 0 3.4981932568 0.8745483142  1  1/4  1
56B(A) 0 1.8960382312 0.9480191156  1  1/2  1
57A (E) 1 5.5555045214 0.4174916397 0.0375745927 2.0000000000 1.0
57B (B) 0 4.3412090891 1.0853022723  1  1/4  1
57C (F) 0 1.4662739791 0.5865095917  1  2/5  1
58A(A) 1 5.4655916989 0.4637041648 0.0424203078 2.0000000000 1.0
58B (B) 0 2.5830187734 1.0332075094 1 2/5 1
61A(A) 1 6.1331931484 0.4856736514 0.0791877314 1.0000000000 1.0
62A(A) 0 4.4349626414 1.1087406604  1  1/4  1
63A(A) 0 2.2066209287 1.1033104643  1  1/2  1
64A(B) 0 3.7081493546 0.9270373387  1  1/4  1
65A(A) 1 5.3828534706 0.5053343423 0.3755140987 0.2500000000 1.0
66A(A) 0 4.7825487441 0.7970914573  1  1/6  1
66B (E) 0 4.4087701205 1.1021925301  1  1/4  1

Curve  r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
66C (I) 0 2.3832296312 1.1916148156  1  1/2  1
67A (A) 0 1.2737700365 1.2737700365  1  1  1
69A (A) 0 2.4058638676 1.2029319338  1  1/2  1
70A (A) 0 2.3606086931 1.1803043466  1  1/2  1
72A (A) 0 1.9465368423 0.9732684211  1  1/2  1
73A (B) 0 2.3653209345 1.1826604672  1  1/2  1
75A (A) 0 1.4025399402 1.4025399402  1  1  1
75B (E) 0 2.5054748897 1.2527374449  1  1/2  1
75C (C) 0 3.1361746475 0.6272349295  1  1/5  1
76A (A) 0 1.1104197465 1.1104197465  1  1  1
77A (F) 1 3.1997813616 0.6273362019 0.0980279793 2.0000000000 1.0
77B (D) 0 1.5489100656 1.0326067104  1  2/3  1
77C (A) 0 2.6516148585 1.3258074292  1  1/2  1
78A (A) 0 1.4504359262 0.7252179631  1  1/2  1
79A (A) 1 5.9508003526 0.5811802159 0.0976642101 1.0000000000 1.0
80A (F) 0 4.0378116400 1.0094529100  1  1/4  1
80B (B) 0 2.2741651990 1.1370825995  1  1/2  1
82A (A) 1 5.1889950404 0.5830015595 0.2247069249 0.5000000000 1.0
83A (A) 1 3.3744689001 0.5982673327 0.1772922941 1.0000000000 1.0
84A (C) 0 2.1903171092 1.0951585546  1  1/2  1
84B (A) 0 1.9449239505 0.9724619753  1  1/2  1
85A (A) 0 2.7953844365 1.3976922183  1  1/2  1
88A (A) 1 4.2525295331 0.6849015939 0.0402643643 4.0000000000 1.0
89A (C) 1 5.5526265646 0.6224765415 0.1121048812 1.0000000000 1.0
89B (A) 0 2.8446096585 1.4223048292  1  1/2  1
90A(M) 0 2.4599353712 0.8199784571  1  1/3  1
90B (A) 0 3.9710942585 1.3236980862  1  1/3  1
90C (E) 0 1.3375959946 1.3375959946  1  1  1
91A (A) 1 3.8972609371 0.5549393665 0.1423921507 1.0000000000 1.0
91B (B) 1 6.0394915365 0.7108113038 1.0592450864 0.1111111111 1.0
92A (A) 0 3.4103924343 1.1367974781 1 1/3 1
92B (C) 1 4.7070877612 0.7033574920 0.0498083973 3.0000000000 1.0
94A (A) 0 2.7134690132 1.3567345066  1  1/2  1
96A (E) 0 4.6856803366 1.1714200841  1  1/4  1
96B (A) 0 4.0043095218 1.0010773805  1  1/4  1
98A (B) 0 1.0019771958 1.0019771958  1  1  1
99A (A) 1 4.4984528866 0.6805515591 0.3025713846 0.5000000000 1.0
99B (H) 0 3.1692296155 0.7923074039  1  1/4  1
99C (F) 0 2.7285845914 1.3642922957  1  1/2  1
99D (C) 0 1.6844963330 1.6844963330  1  1  1
100A (A) 0 2.5261979246 1.2630989623  1  1/2  1
101A (A) 1 4.5902472119 0.7560295657 0.1647034529 1.0000000000 1.0
102A (E) 1 4.7278638235 0.6772848980 0.1432538929 1.0000000000 1.0
102B (G) 0 2.9593558556 1.4796779278  1  1/2  1
102C (A) 0 2.7860649844 0.9286883281  1  1/3  1
104A (A) 0 1.1836111473 1.1836111473  1  1  1
105A (A) 0 5.8634534537 1.4658633634  1  1/4  1
106A (B) 0 3.7857830586 1.2619276862  1  1/3  1
106B (A) 1 5.0128820343 0.6909022751 0.0689126804 2.0000000000 1.0
106C (E) 0 0.5717994122 1.5247984324  1  8/3  1
106D (D) 0 1.0421614431 1.0421614431  1  1  1
108A (A) 0 3.3387380236 1.1129126745  1  1/3  1

Curve  r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
109A(A) 0 1.4110259162 1.4110259162  1  1  1
110A (C) 0 1.3595418147 1.3595418147  1  1  1
110B (A) 0 4.6222420328 1.5407473443  1  1/3  1
110C (E) 0 2.8261738995 0.9420579665  1  1/3  1
112A(K) 1 3.3732121966 0.8093007286 0.2399198987 1.0000000000 1.0
112B (A) 0 2.2962114575 1.1481057287  1  1/2  1
112C (E) 0 1.3254912397 1.3254912397  1  1  1
113A (B) 0 2.0183698932 1.0091849466  1  1/2  1
114A(A) 0 3.1488707131 1.5744353566  1  1/2  1
114B (E) 0 1.5271441130 0.7635720565  1  1/2  1
114C(G) 0 1.1101789855 1.3877237318  1  5/4  1
115A(A) 0 1.8080388810 1.8080388810  1  1  1
116A (E) 0 0.2863256792 0.8589770377  1  3  1
116B (A) 0 3.8294768331 1.2764922777  1  1/3  1
116C (D) 0 2.6462381980 1.3231190990  1  1/2  1
117A(A) 1 2.6403251263 0.7461133887 1.1303356262 0.2500000000 1.0
118A(A) 1 4.1584572190 0.7311083080 0.0879061957 2.0000000000 1.0
118B (B) 0 3.4884515797 1.3953806319  1  2/5  1
118C (D) 0 1.6840974200 1.6840974200  1  1  1
118D (E) 0 1.0990077472 1.0990077472  1  1  1
120A (E) 0 5.0779771119 1.2694942780  1  1/4  1
120B (A) 0 2.4898202911 1.2449101455  1  1/2  1
121A(H) 0 1.0197948618 1.0197948618  1  1  1
121B (D) 1 4.8024213220 0.8623722967 0.0897851562 2.0000000000 1.0
121C (F) 0 1.6661569204 1.6661569204  1  1  1
121D(A) 0 0.8796995193 1.7593990387  1  2  1
122A(A) 1 2.9660992729 0.7168659467 0.1208432154 2.0000000000 1.0
123A(A) 1 3.9950826936 0.6715905138 0.8405214175 0.2000000000 1.0
123B (C) 1 2.9874191593 0.8720710560 0.2919145287 1.0000000000 1.0
124A (B) 1 4.9333272334 0.8559827493 0.5205306939 0.3333333333 1.0
124B (A) 0 1.1755295616 1.1755295616  1  1  1
126A(A) 0 1.5305454481 1.5305454481  1  1  1
126B(G) 0 0.9104737369 0.9104737369  1  1  1
128A (C) 1 4.0364616539 0.8725440838 0.4323311646 0.5000000000 1.0
128B (F) 0 1.9426724598 0.9713362299  1  1/2  1
128C (A) 0 2.7473537399 1.3736768699  1  1/2  1
128D(G) 0 2.8542094075 1.4271047037  1  1/2  1
129A (E) 1 4.4728045672 0.8941955093 0.0999591527 2.0000000000 1.0
129B (B) 0 2.1455286131 1.6091464598 1 3/4 1
130A (E) 1 3.7842289994 0.7382173988 1.1704641536 0.1666666667 1.0
130B (A) 0 3.1294275088 1.5647137544  1  1/2  1
130C (J) 0 0.8865474519 1.7730949038  1  2  1
131A(A) 1 4.1716092763 0.9014647353 0.2160951987 1.0000000000 1.0
132A(A) 0 2.6563291575 1.3281645788  1  1/2  1
132B (C) 0 2.1888884346 1.0944442173  1  1/2  1
135A(A) 1 3.7814246602 0.6703486968 0.0295456852 6.0000000000 1.0
135B (B) 0 0.9833356547 1.9666713094 1 2 1
136A(A) 1 3.8871054798 0.8998959875 0.2315079928 1.0000000000 1.0
136B (C) 0 2.8672616758 1.4336308379 1 1/2 1
138A (E) 1 4.4583602683 0.7907712971 0.1773681913 1.0000000000 1.0
138B(G) 0 3.0602034222 1.0200678074  1  1/3  1
138C (A) 0 2.9754615368 1.4877307684  1  1/2  1

Curve  r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
139A(A) 0 1.7396869770 1.7396869770  1  1  1
140A(A) 0 1.3443015422 1.3443015422  1  1  1
140B (C) 0 1.5555116321 1.5555116321  1  1  1
141A (E) 1 2.9765040248 0.7185501725 0.0344867750 7.0000000000 1.0
141B(G) 0 1.3805576056 0.6902788028  1  1/2  1
141C (A) 0 3.8499118765 0.9624779691  1  1/4  1
141D (I) 1 4.7295280333 0.9387887853 0.1984952365 1.0000000000 1.0
141 E (H) 0 2.1075355786 2.1075355786 1 1 1
142A (F) 1 3.4643325948 1.0535114537 0.0337891426 9.0000000000 1.0
142B (E) 1 4.4304737755 0.8015334521 0.1809137110 1.0000000000 1.0
142C (A) 0 1.8851444898 0.9425722449  1  1/2  1
142D (C) 0 5.2000441497 1.7333480499  1  1/3  1
142 E (G) 0 1.3008551919 1.3008551919  1  1  1
143A(A) 1 1.9699231646 0.9456964112 0.2400338318 2.0000000000 1.0
144A(A) 0 2.4286506479 1.2143253239  1  1/2  1
144B (E) 0 2.4901297792 1.2450648896  1  1/2  1
145A(A) 1 5.6915790981 0.8316217075 0.5844576299 0.2500000000 1.0
147A (C) 0 1.4445724908 0.7222862454  1  1/2  1
147B (I) 0 2.1340337345 2.1340337345  1  1  1
147C (A) 0 1.9200537453 1.9200537453  1  1  1
148A(A) 1 3.3849941577 0.9773274900 0.0962411794 3.0000000000 1.0
150A(A) 0 1.7692592483 1.7692592483  1  1  1
150B(G) 0 0.7912367898 0.7912367898  1  1  1
150C (I) 0 1.4990368329 1.4990368329  1  1  1
152A(A) 1 3.6456468990 0.9539180658 0.0654148696 4.0000000000 1.0
152B (B) 0 1.3670652145 1.3670652145 1 1 1
153A (C) 1 5.0866355584 0.7068417367 0.0694802811 2.0000000000 1.0
153B (A) 1 2.2547575497 1.0181559607 0.1128897385 4.0000000000 1.0
153C (E) 0 3.1705064379 1.5852532190  1  1/2  1
153D(D) 0 1.0383987258 2.0767974516  1  2  1
154A (C) 1 3.5423530689 0.8716922254 0.2460771720 1.0000000000 1.0
154B (E) 0 1.1263920237 1.6895880356  1  3/2  1
154C (A) 0 1.2199842863 1.2199842863  1  1  1
155A(D) 1 2.2165110787 0.6715528888 1.5148872822 0.2000000000 1.0
155B (A) 0 2.1141393763 1.0570696881 1 1/2 1
155C (C) 1 5.3453690009 0.9843172157 0.1841439226 1.0000000000 1.0
156A (E) 1 4.5382403755 1.0035030550 0.1474144120 1.5000000000 1.0
156B (A) 0 2.7522991873 1.3761495936 1 1/2 1
158A (E) 1 3.5817087725 1.1172146322 0.0389902803 8.0000000000 1.0
158B (D) 1 5.3375846274 0.8451399432 0.0791687629 2.0000000000 1.0
158C (H) 0 1.9304530479 1.5443624383  1  4/5  1
158D (B) 0 1.6852937385 1.1235291590  1  2/3  1
158 E (F) 0 3.8328305468 1.9164152734  1  1/2  1
160A(D) 1 5.4517057364 0.9777440810 0.3586929040 0.5000000000 1.0
160B (A) 0 3.0115524554 1.5057762277  1  1/2  1
161A (B) 0 3.4513373072 0.8628343268  1  1/4  1
162A(K) 1 4.3954427629 0.8964795141 0.3059348839 0.6666666667 1.0
162B(G) 0 5.0519074124 1.6839691375  1  1/3  1
162C (A) 0 2.8006777426 0.9335592475  1  1/3  1
162D (E) 0 2.6051702504 1.7367801669  1  2/3  1
163A(A) 1 5.5180730712 1.0479330218 0.1899092325 1.0000000000 1.0
166A(A) 1 4.7801672708 0.8600170155 0.0899567909 2.0000000000 1.0

Curve  r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
168A (B) 0 2.9025247409 1.4512623705  1  1/2  1
168B (E) 0 2.3215093041 1.1607546520  1  1/2  1
170A(A) 1 4.0409291005 0.8289341482 0.2051345440 1.0000000000 1.0
170B (H) 0 1.9117819746 0.6372606582  1  1/3  1
170C (F) 0 0.7915291521 1.8469013550  1  7/3  1
170D(D) 0 3.3291061788 1.1097020596  1  1/3  1
170 E (C) 0 1.3360256749 1.3360256749  1  1  1
171A(D) 0 3.4734453619 0.8683613405  1  1/4  1
171B (A) 1 2.3827779033 1.0768577238 0.2259668688 2.0000000000 1.0
171C (I) 0 1.0700870190 2.1401740379  1  2  1
171D(H) 0 1.1075480554 2.2150961108  1  2  1
172A(A) 1 4.0096273260 1.0159589215 0.7601396630 0.3333333333 1.0
174A (I) 0 0.4362942674 1.0180199573  1  7/3  1
174B(G) 0 1.8598039585 1.8598039585  1  1  1
174C (F) 0 1.5847007717 1.5847007717  1  1  1
174D(A) 0 2.2764447598 1.1382223799  1  1/2  1
174 E (E) 0 0.8687758077 0.8687758077  1  1  1
175A (B) 1 2.6245205399 0.6977340315 0.1329259994 2.0000000000 1.0
175B (C) 1 2.8291631631 1.0476202635 0.0925733338 4.0000000000 1.0
175C (F) 0 1.1737212671 2.3474425342  1  2  1
176A (C) 0 1.6554236532 1.6554236532  1  1  1
176B (D) 0 1.4588166169 1.4588166169  1  1  1
176C (A) 1 3.0540697209 1.0693142864 0.1750638303 2.0000000000 1.0
178A(A) 0 1.4760248421 1.9680331227  1  4/3  1
178B (C) 0 2.5803848480 1.2901924240  1  1/2  1
179A(A) 0 2.2601982547 2.2601982547  1  1  1
180A(A) 0 2.6259797797 1.3129898898  1  1/2  1
182A (E) 0 0.7188679094 1.7971697734  1  5/2  1
182B (A) 0 1.9204065876 1.9204065876  1  1  1
182C (J) 0 1.2089756349 1.2089756349  1  1  1
182D(D) 0 2.1353664019 2.1353664019  1  1  1
182 E (I) 0 1.3931977005 1.3931977005  1  1  1
184A (C) 1 4.4163757466 1.0875847398 0.1231309112 2.0000000000 1.0
184B (B) 1 5.3243221525 1.0975263443 0.1030672368 2.0000000000 1.0
184C (D) 0 2.5979495920 1.2989747960  1  1/2  1
184D(A) 0 0.8765533735 1.7531067469  1  2  1
185A(D) 1 3.5930803975 0.8196298176 0.1140567044 2.0000000000 1.0
185B (A) 1 4.8983715401 1.0803747090 0.1102789672 2.0000000000 1.0
185C (B) 1 3.4935106383 1.2447948639 1.4252652907 0.2500000000 1.0
186A(D) 0 0.7823354594 0.7823354594  1  1  1
186B (B) 0 1.9528976690 1.9528976690  1  1  1
186C (A) 0 1.1823572975 1.1823572975  1  1  1
187A(A) 0 2.1146369273 1.4097579516  1  2/3  1
187B (C) 0 2.3270976414 2.3270976414  1  1  1
189A(A) 1 4.0550955533 0.7689943976 0.0632121888 3.0000000000 1.0
189B (C) 1 5.4604576374 1.1304624983 1.8632435522 0.1111111111 1.0
189C (F) 0 3.7360320500 1.2453440167  1  1/3  1
189D (B) 0 2.2649180731 2.2649180731  1  1  1
190A(D) 1 2.7276120737 1.2342342404 0.0205680115 22.000000000 1.0
190B (C) 1 3.4751792755 0.9162065638 0.1318214819 2.0000000000 1.0
190C (A) 0 0.9862313357 1.9724626715 1 2 1
192A(Q) 1 3.3132763405 1.1195591687 1.3516037344 0.2500000000 1.0

Curve  r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
192B (A) 0 5.6629488337 1.4157372084  1  1/4  1
192C (K) 0 3.0497736762 1.5248868381  1  1/2  1
192D (E) 0 2.3840110146 1.1920055073  1  1/2  1
194A (A) 0 3.7750977496 1.8875488748  1  1/2  1
195A (A) 0 4.0228485413 1.0057121353  1  1/4  1
195B (I) 0 2.4793554937 2.4793554937  1  1  1
195C (K) 0 0.8075282392 2.4225847175  1  3  1
195D (J) 0 2.1212032775 2.1212032775  1  1  1
196A (A) 1 4.3609185288 1.1255807768 0.0860354510 3.0000000000 1.0
196B (C) 0 1.5672749721 1.5672749721 1 1 1
197A (A) 1 5.6695604223 0.7873204700 0.1388679918 1.0000000000 1.0
198A (I) 1 2.5334819295 0.9882757884 0.1950429914 2.0000000000 1.0
198B (E) 0 1.8053975906 1.8053975906  1  1  1
198C(M) 0 2.7073977438 1.8049318292  1  2/3  1
198D (A) 0 2.9230911893 0.9743637298  1  1/3  1
198 E (Q) 0 1.0857413665 1.0857413665  1  1  1
200A (B) 0 0.8086102703 0.8086102703  1  1  1
200B (C) 1 3.7121152732 1.0884331301 0.2932110266 1.0000000000 1.0
200C (G) 0 2.6553977578 1.3276988789  1  1/2  1
200D (E) 0 1.6601084182 1.6601084182  1  1  1
200 E (A) 0 1.8081075317 1.8081075317  1  1  1
201A  1 3.4396827280 0.7311199568 0.1062772376 2.0000000000 1.0
201B  1 3.9730794904 1.0237848640 0.0858934794 3.0000000000 1.0
201C  1 3.1413000178 1.3514120376 0.4302078853 1.0000000000 1.0
202A  0 1.0396665953 1.0396665953  1  1  1
203A  0 1.7527085873 0.3505417175  1  1/5  1
203B  1 2.1960815500 0.9130968311 0.2078922869 2.0000000000 1.0
203C  0 4.1972127996 2.0986063998  1  1/2  1
204A  0 0.3761481280 1.1284443840  1  3  1
204B  0 1.5198335215 1.5198335215  1  1  1
205A  1 4.8982345731 0.9812396964 1.6026013973 0.1250000000 1.0
205B  0 2.2297855138 1.1148927569  1  1/2  1
205C  0 4.1540692640 2.0770346320  1  1/2  1
206A  0 2.8621154666 1.4310577333  1  1/2  1
207A  1 2.7562368184 0.9785571203 0.3550337597 1.0000000000 1.0
208A  1 1.7396717417 1.1571474716 0.1662881916 4.0000000000 1.0
208B  1 3.7085476616 1.1687186183 0.0787854657 4.0000000000 1.0
208C  0 2.8023148363 1.4011574181  1  1/2  1
208D  0 0.9020285967 1.8040571934  1  2  1
209A  1 2.8242928435 1.2523241408 0.6651173640 0.6666666667 1.0
210A  0 1.9904248604 1.9904248604  1  1  1
210B  0 2.3533261493 1.1766630746  1  1/2  1
210C  0 1.6773824351 1.6773824351  1  1  1
210D  1 3.5846020263 0.9546630067 0.5326465810 0.5000000000 1.0
210 E 0 1.0259330100 2.0518660200 1 2 1
212A  1 3.5702124333 1.1728370526 0.1095020791 3.0000000000 1.0
212B  0 1.1700042516 1.7550063774  1  3/2  1
213A  0 3.8962324367 1.9481162183  1  1/2  1
214A  1 3.9012468358 1.3657652583 0.0500120425 7.0000000000 1.0
214B  1 3.4346780132 0.8945585519 0.2604490285 1.0000000000 1.0
214C  1 3.2209151387 1.0782012651 0.1673749880 2.0000000000 1.0
214D  0 3.0714435058 2.0476290039  1  2/3  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
215A  1 1.3878357096 1.2136934223 0.4372612024 2.0000000000 1.0
216A  1 3.3065764467 1.2396536502 0.0312421238 12.000000000 1.0
216B  0 1.3100970703 1.3100970703  1  1  1
216C  0 1.3892474299 1.3892474299  1  1  1
216D  0 0.7284172462 1.4568344924  1  2  1
218A  1 3.6044066451 1.3776391764 0.5733145475 0.6666666667 1.0
219A  1 5.6338346986 0.7445712952 0.1321606570 1.0000000000 1.0
219B  1 3.0575161484 1.2803214992 1.2562368639 0.3333333333 1.0
219C  1 1.5909301236 1.4044028079 1.7655116175 0.5000000000 1.0
220A  1 3.1205498611 1.1411181831 0.7313571222 0.5000000000 1.0
220B  0 3.4764596611 1.7382298305  1  1/2  1
221A  0 1.9250249682 0.9625124841  1  1/2  1
221B  0 4.3522001524 2.1761000762  1  1/2  1
222A  0 2.0529956743 2.0529956743  1  1  1
222B  0 1.6808078275 1.6808078275  1  1  1
222C  0 1.7930022995 0.8965011497  1  1/2  1
222D  0 1.2987881634 1.2987881634  1  1  1
222 E  0 0.6807637973 0.6807637973  1  1  1
224A  1 2.9056796324 1.1435250754 0.7870964594 0.5000000000 1.0
224B 0 3.4350375032 1.7175187516 1 1/2 1
225A  1 4.0529757590 1.2453986751 0.1536400350 2.0000000000 1.0
225B  0 1.8125458617 1.2083639078  1  2/3  1
225C  0 0.8242959390 0.8242959390  1  1  1
225D  0 1.2056681714 2.4113363427  1  2  1
225 E  1 2.6959559895 0.8278123885 0.0255880905 12.000000000 1.0
226A  1 3.6884308015 1.3960301214 0.2523259342 1.5000000000 1.0
228A 0 2.4763879622 1.2381939811 1 1/2 1
228B  1 2.6951042086 1.2048427141 0.0745081093 6.0000000000 1.0
229A  1 4.0779758306 1.0708644692 0.2625970613 1.0000000000 1.0
231A 0 4.6583108957 0.5822888620 1 1/8 1
232A  1 2.1738325628 1.2149825685 0.2794563365 2.0000000000 1.0
232B  0 0.7973190120 1.5946380240  1  2  1
233A  0 2.7842671971 1.3921335986  1  1/2  1
234A  0 1.0415729062 1.0415729062  1  1  1
234B  0 0.9776832784 1.9553665569  1  2  1
234C  1 3.8376981202 1.0636553091 0.2771597129 1.0000000000 1.0
234D  0 0.4593769991 1.8375079963  1  4  1
234 E  0 2.0087998968 2.0087998968  1  1  1
235A  1 3.8526221204 0.9646622016 0.0834636923 3.0000000000 1.0
235B  0 0.6184601660 0.6184601660  1  1  1
235C  0 2.8253354850 2.8253354850  1  1  1
236A  1 4.3419651590 1.2389727062 0.0951161253 3.0000000000 1.0
236B 0 4.9840035894 1.6613345298 1 1/3 1
238A  1 1.9151889279 1.4310007528 0.1067407377 7.0000000000 1.0
238B  1 3.3407446902 1.0723237703 0.6419669084 0.5000000000 1.0
238C  0 3.9826564062 1.9913282031  1  1/2  1
238D  0 2.3178772183 2.3178772183  1  1  1
238 E  0 1.5219415283 1.5219415283  1  1  1
240A  0 2.4128899940 1.2064449970  1  1/2  1
240B  0 1.1583921113 1.1583921113  1  1  1
240C  1 2.7966571710 1.2467793271 0.8916211397 0.5000000000 1.0
240D  0 1.5962422221 1.5962422221  1  1  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
242A  1 2.9307853161 1.4486447784 0.1235713829 4.0000000000 1.0
242 B 0 0.8024848730 0.5349899154 1 2/3 1
243A  1 2.5479339785 1.2901905904 0.5063673554 1.0000000000 1.0
243 B 0 3.6747566856 1.2249188952 1 1/3 1
244A  1 3.0228752686 1.3210444110 0.1456719507 3.0000000000 1.0
245A  1 3.2744322569 0.6333450086 0.0322368866 6.0000000000 1.0
245 B 0 0.5312987757 1.0625975514 1 2 1
245 C  1 0.8334283978 1.2247323722 0.3673778022 4.0000000000 1.0
246A  0 0.5888594615 1.7665783844  1  3  1
246 B  0 0.4325831931 2.1629159655  1  5  1
246 C  0 0.1839332913 1.1035997477  1  6  1
246D  1 3.1765117809 1.0083093657 0.3174266098 1.0000000000 1.0
246 E  0 4.1719564061 2.0859782030  1  1/2  1
246 F  0 3.9949562396 1.3316520799  1  1/3  1
246G  0 0.9386205914 0.9386205914  1  1  1
248A  1 4.2937936508 1.2011105983 0.1398658967 2.0000000000 1.0
248 B 0 2.1235184936 1.0617592468 1 1/2 1
248 C  1 2.6434410671 1.3306506590 0.2516891100 2.0000000000 1.0
249A  1 4.4420811152 0.9837596203 0.2214636777 1.0000000000 1.0
249 B  1 3.5061259800 1.5162589107 0.4324599057 1.0000000000 1.0
252A 0 1.3797968090 1.3797968090 1 1 1
252 B  1 2.2699063939 1.3316363642 0.0977746900 6.0000000000 1.0
254A  1 3.4367838321 1.4824320446 0.4313428243 1.0000000000 1.0
254 B 0 3.0580721852 1.5290360926 1 1/2 1
254 C  1 3.1765169064 1.1103341928 0.3495445564 1.0000000000 1.0
254D 0 2.6996100272 2.0247075204 1 3/4 1
256A  1 5.0378540936 1.2094018572 0.4801257975 0.5000000000 1.0
256 B  1 4.4097575960 1.3421296388 0.6087090320 0.5000000000 1.0
256 C  0 3.1181694995 1.5590847498  1  1/2  1
256D  0 3.5623007922 1.7811503961  1  1/2  1
258A  1 2.0851846863 1.0523025616 0.2523283833 2.0000000000 1.0
258 B 0 1.5081807103 0.7540903551 1 1/2 1
258 C  1 3.5120735391 1.1803278628 0.0336077206 10.000000000 1.0
258D  0 2.2171216802 1.6628412601  1  3/4  1
258 E  0 0.9267300968 1.8534601936  1  2  1
258 F  0 1.0680841434 2.1361682868  1  2  1
258G  0 4.4942612748 2.2471306374  1  1/2  1
259A  0 1.2860376931 1.9290565397  1  3/2  1
260A  0 3.5288383291 1.7644191645  1  1/2  1
262A  1 2.4323576003 1.5125639330 0.0565319064 11.000000000 1.0
262 B  1 5.2733474636 1.1340473415 0.2150526491 1.0000000000 1.0
264A  0 3.2306740713 1.6153370356  1  1/2  1
264 B  0 2.5539883833 1.2769941916  1  1/2  1
264 C  0 3.0763437704 1.5381718852  1  1/2  1
264D  0 0.5045516422 1.7659307477  1  7/2  1
265A  1 3.9017641877 1.0720624179 1.0990540344 0.2500000000 1.0
267A  0 4.2548896082 1.4182965361  1  1/3  1
267 B  0 1.1529749720 1.1529749720  1  1  1
268A  0 1.9329143630 1.9329143630  1  1  1
269A  1 4.1094064150 1.3612506241 0.3312523724 1.0000000000 1.0
270A  0 2.9614322886 0.9871440962  1  1/3  1
270 B  0 1.1639830028 1.9399716713  1  5/3  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
270 C  0 2.0452697337 2.0452697337  1  1  1
270D  0 3.2587738278 1.0862579426  1  1/3  1
272A  1 3.6319660374 1.2387792395 0.3410767685 1.0000000000 1.0
272 B  1 2.7457391181 1.3977853806 0.5090743587 1.0000000000 1.0
272 C  0 3.4730634628 1.7365317314  1  1/2  1
272D  0 1.8641750575 1.8641750575  1  1  1
273A  1 2.9063397998 0.7937029426 0.0455156082 6.0000000000 1.0
273 B 0 0.3565960398 2.8527683184 1 8 1
274A  1 3.6347902471 1.5350419553 0.0603313240 7.0000000000 1.0
274 B  1 2.3854034454 1.1270779102 0.4724894283 1.0000000000 1.0
274 C  1 4.1119537843 1.1574087493 0.5629483258 0.5000000000 1.0
275A  1 1.8401405799 1.0969494293 2.3844904924 0.2500000000 1.0
275 B 0 2.8380382820 2.8380382820 1 1 1
277A  1 2.6649848531 1.5289849020 0.5737311791 1.0000000000 1.0
278A  1 2.9825516172 1.5630333549 0.0655073891 8.0000000000 1.0
278 B 0 1.1816539317 0.7877692878 1 2/3 1
280A  1 3.4289082752 1.3363376683 0.0974317159 4.0000000000 1.0
280 B  1 1.7288713940 1.1698436166 0.0112775269 60.000000000 1.0
282A 0 1.2412727555 1.8619091332 1 3/2 1
282 B  1 3.1689198047 1.6378344218 0.1292107818 4.0000000000 1.0
285A  1 1.7646479001 1.1896124823 0.2696543559 2.5000000000 1.0
285 B  1 1.5380021359 1.6159662807 2.1013836627 0.5000000000 1.0
285 C  0 1.0845657569 1.6268486353  1  3/2  1
286A  0 2.3766175169 0.7922058390  1  1/3  1
286 B  1 1.7061664868 1.6606489871 0.0374354527 26.000000000 1.0
286 C  1 4.0135805233 1.0773574603 0.1342140084 2.0000000000 1.0
286D  0 0.9232396695 1.8464793390  1  2  1
286 E  0 0.8172352255 2.4517056765  1  3  1
286 F  0 2.5074142997 2.5074142997  1  1  1
288A  1 2.8175842074 1.4121235928 0.5011823920 1.0000000000 1.0
288 B  1 2.3118891803 1.4337635566 1.2403393457 0.5000000000 1.0
288 C  0 2.7052788037 1.3526394018  1  1/2  1
288D  0 3.0276912696 1.5138456348  1  1/2  1
288 E  0 1.6267330006 1.6267330006  1  1  1
289A  1 1.5008878200 1.1388947570 3.0352561777 0.2500000000 1.0
290A  1 1.6518740857 1.1736436288 1.4209843703 0.5000000000 1.0
291A  0 0.6260093262 0.6260093262  1  1  1
291 B  0 1.9049982068 0.4762495517  1  1/4  1
291 C  1 4.6468112382 1.0274509269 0.4422176302 0.5000000000 1.0
291D  0 2.4120051562 2.4120051562  1  1  1
294A  0 1.8280004280 1.8280004280  1  1  1
294 B  0 2.2120648950 2.2120648950  1  1  1
294 C  0 0.5960449739 2.3841798957  1  4  1
294D  0 1.3860857439 1.3860857439  1  1  1
294 E  0 0.6693039984 0.6693039984  1  1  1
294 F  0 0.5279473056 1.0558946111  1  2  1
294G  1 2.3005218481 1.2377532023 0.1345078730 4.0000000000 1.0
296A  1 3.9715557928 1.3559367025 0.0853529935 4.0000000000 1.0
296 B  1 4.1037703943 1.3782253637 0.1679218415 2.0000000000 1.0
297A  1 2.5629322349 0.8902546662 0.0578929773 6.0000000000 1.0
297 B  1 3.6511448387 1.1489951990 0.3146944999 1.0000000000 1.0
297 C  1 1.6944590385 1.7349705760 0.3413027475 3.0000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
297D  0 1.3749252643 2.7498505287  1  2  1
298A  1 3.3567106288 1.6025685289 0.0530469229 9.0000000000 1.0
298B  1 2.7479579664 1.1527590057 0.4194965934 1.0000000000 1.0
300A  0 1.2133770573 1.2133770573  1  1  1
300B  0 0.5426387165 1.6279161494  1  3  1
300C  0 1.7025229104 1.7025229104  1  1  1
300D  1 3.8069569608 1.3840260497 0.1211839328 3.0000000000 1.0
302A  1 2.4415192618 1.6931432719 1.1557989721 0.6000000000 1.0
302B 0 3.1902035597 1.5951017799 1 1/2 1
302C  1 3.3905862727 1.5310645332 0.0903126722 5.0000000000 1.0
303A  1 1.3761905514 1.4855694061 0.0771056743 14.000000000 1.0
303B  1 3.8524410972 1.0003648583 0.0649175960 4.0000000000 1.0
304A  1 1.1779812107 1.5451623821 0.3279259398 4.0000000000 1.0
304B 0 0.6013138790 1.2026277580 1 2 1
304C  1 3.3697463259 1.3932747404 0.1033664411 4.0000000000 1.0
304D  0 1.8637144373 1.8637144373  1  1  1
304 E  0 2.0635461959 2.0635461959  1  1  1
304 F  1 4.3504123451 1.2842245406 0.1475980251 2.0000000000 1.0
306A 0 0.6894353592 2.0683060777 1 3 1
306B  1 2.1525639425 1.2110949196 0.5626290098 1.0000000000 1.0
306C  0 1.1471740369 1.1471740369  1  1  1
306D  0 2.2491921794 2.2491921794  1  1  1
307A  0 1.4189146241 1.4189146241  1  1  1
307B  0 2.3490923578 2.3490923578  1  1  1
307C  0 2.8002613258 2.8002613258  1  1  1
307D  0 3.1747546988 3.1747546988  1  1  1
308A  1 3.1762112278 1.3891063820 0.0728911630 6.0000000000 1.0
309A  1 3.4344206940 1.2276894797 0.0714932496 5.0000000000 1.0
310A 0 0.8355225373 2.5065676119 1 3 1
310B  1 2.5186376495 1.6415121933 0.9776191071 0.6666666667 1.0
312A 0 1.6605942610 1.6605942610 1 1 1
312B  1 3.6898752967 1.4061524822 0.3810840121 1.0000000000 1.0
312C  0 3.5553735765 1.7776867882  1  1/2  1
312D  0 4.5800008728 1.1450002182  1  1/4  1
312 E  0 1.4416548405 1.4416548405  1  1  1
312 F  1 2.5056872215 1.5607603031 0.2076290408 3.0000000000 1.0
314A  1 1.8289592463 1.2254919999 0.3350244141 2.0000000000 1.0
315A 0 1.2730829064 1.2730829064 1 1 1
315B  1 2.1956280654 1.1391577593 1.0376600456 0.5000000000 1.0
316A 0 1.3028108436 1.3028108436 1 1 1
316B  1 3.1195572511 1.2203951480 0.1304026020 3.0000000000 1.0
318A  0 1.8177609136 1.8177609136  1  1  1
318B  0 3.9710894510 1.3236964837  1  1/3  1
318C  1 1.7722504261 1.1170141948 0.3151400554 2.0000000000 1.0
318D  1 2.4120272485 1.7453725128 0.0328914668 22.000000000 1.0
318 E  0 1.0987950980 1.0987950980  1  1  1
319A  0 0.9677788808 1.9355577615  1  2  1
320A  0 2.8551639918 1.4275819959  1  1/2  1
320B  1 4.1985525041 1.5161085153 0.7222053381 0.5000000000 1.0
320C  0 3.9942696310 1.9971348155  1  1/2  1
320D  0 3.8549380952 1.9274690476  1  1/2  1
320 E  0 2.1294891631 1.0647445816  1  1/2  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
320 F  1 3.2161552676 1.3296773088 0.8268738280 0.5000000000 1.0
322A  1 2.4232379290 1.2132690207 0.1668936434 3.0000000000 1.0
322B  0 1.4602213361 1.4602213361  1  1  1
322C  0 4.9916139661 2.4958069830  1  1/2  1
322D  1 2.8164413550 1.6590507174 0.2356236837 2.5000000000 1.0
323A  0 1.8660949120 1.8660949120  1  1  1
324A  0 4.8202741093 1.6067580364  1  1/3  1
324B  0 1.6541764509 1.6541764509  1  1  1
324C  1 3.8631214144 1.4974408733 0.3876245949 1.0000000000 1.0
324D 0 3.8507505887 1.2835835296 1 1/3 1
325A  1 2.3706727615 1.5716909753 1.9889176619 0.3333333333 1.0
325B  1 5.3009854472 1.3630614806 0.2571336017 1.0000000000 1.0
325C  0 2.4072852546 2.4072852546  1  1  1
325D  0 1.0054544996 3.0163634989  1  3  1
325 E  0 2.2482646094 0.4496529219  1  1/5  1
326A  1 1.5955523534 1.2315028128 0.7718347882 1.0000000000 1.0
326B  1 4.0636363622 1.6801606398 0.0826924700 5.0000000000 1.0
326C 0 1.3118305721 0.4372768574 1 1/3 1
327A  1 2.2027451583 1.2543242932 0.1423592158 4.0000000000 1.0
328A  1 2.6783928660 1.5196480443 1.1347461857 0.5000000000 1.0
328B  0 4.0075079103 2.0037539552  1  1/2  1
329A  0 0.7968920264 0.7968920264  1  1  1
330A  0 0.7813961756 0.7813961756  1  1  1
330B  0 2.4188689938 2.4188689938  1  1  1
330C  0 0.9389804493 1.8779608987  1  2  1
330D  0 0.5190109186 1.8165382150  1  7/2  1
330 E  1 2.2164710033 1.1562800329 0.5216761380 1.0000000000 1.0
331A  1 5.4083773317 0.9790098108 0.1810172905 1.0000000000 1.0
333A  1 2.0410609926 1.4792994921 0.7247698611 1.0000000000 1.0
333B  1 2.0333288908 1.8286710385 1.7986967546 0.5000000000 1.0
333C  1 2.5034325770 1.2023832503 0.9605876837 0.5000000000 1.0
333D  0 2.8306206392 2.8306206392  1  1  1
334A  0 2.2906969318 2.2906969318  1  1  1
335A  1 4.2194745615 1.4976179639 0.1774649831 2.0000000000 1.0
336A  0 2.3898781774 1.1949390887  1  1/2  1
336B  0 5.4362515690 1.3590628923  1  1/4  1
336C  0 1.1982307057 1.7973460585  1  3/2  1
336D  0 0.7884933856 1.5769867712  1  2  1
336 E  1 1.9109897808 1.4261701612 0.3731496043 2.0000000000 1.0
336 F 0 3.9315932027 1.9657966013 1 1/2 1
338A  1 3.7619828722 1.2776773619 0.1698143513 2.0000000000 1.0
338B  0 1.0433863187 2.0867726374  1  2  1
338C  0 1.2869571133 2.5739142267  1  2  1
338D  0 0.5396273391 1.0792546783  1  2  1
338 E  1 1.9456540409 1.7940807919 0.1536827509 6.0000000000 1.0
338 F  1 1.2055736044 0.9530562430 0.1976354325 4.0000000000 1.0
339A  1 2.5311158528 1.5850840591 0.0695821374 9.0000000000 1.0
339B 0 2.6056637603 2.6056637603 1 1 1
339C  1 3.9967355775 1.0125851133 0.0844510137 3.0000000000 1.0
340A  1 4.7549194562 1.5553431744 0.4361358627 0.7500000000 1.0
342A  0 0.6943374598 2.0830123794  1  3  1
342B  0 2.1705272030 2.1705272030  1  1  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
342 C  1 1.7816724980 1.2648109168 0.3549504520 2.0000000000 1.0
342D 0 2.2375637156 2.2375637156 1 1 1
342 E  1 3.9793483508 1.2390587277 0.3113722696 1.0000000000 1.0
342 F  0 0.9193234687 0.9193234687  1  1  1
342G  0 1.3602155382 1.3602155382  1  1  1
344A  1 2.7525869611 1.5494621523 0.2814556223 2.0000000000 1.0
345A 0 0.4590292151 0.9180584301 1 2 1
345 B  1 4.2977618837 1.5964898077 0.1857350234 2.0000000000 1.0
345 C  0 0.8426900245 2.1067250613  1  5/2  1
345D  0 2.1209719918 1.0604859959  1  1/2  1
345 E  0 1.2779994655 2.5559989310  1  2  1
345 F  1 2.0934610738 1.0776581097 0.0214488924 24.000000000 1.0
346A 0 2.3864267831 2.3864267831 1 1 1
346 B  1 3.2277857995 1.8161375715 0.0803796288 7.0000000000 1.0
347A  1 3.0596247368 1.0692572441 0.3494733296 1.0000000000 1.0
348A  1 3.3700624663 1.4721036783 0.1456059735 3.0000000000 1.0
348 B  0 1.8569948187 1.8569948187  1  1  1
348 C  0 1.1001223703 1.1001223703  1  1  1
348D  1 2.7246446828 1.6385158325 0.0286366013 21.000000000 1.0
350A  0 1.0556963012 1.0556963012  1  1  1
350 B  0 1.2015896516 2.4031793031  1  2  1
350 C  1 2.6868361419 1.1698407546 0.2176985668 2.0000000000 1.0
350D  0 2.6582491803 2.6582491803  1  1  1
350 E  0 0.8585438894 1.7170877788  1  2  1
350 F  1 1.9197624983 1.6277461855 0.0128468084 66.000000000 1.0
352A 0 0.9197112746 1.8394225491 1 2 1
352 B  1 2.6902393719 1.6620028340 0.3088949726 2.0000000000 1.0
352 C  1 3.6135445187 1.4943761442 0.2067742817 2.0000000000 1.0
352D  1 1.7453844567 1.4403302305 0.4126111657 2.0000000000 1.0
352 E 0 1.1446739244 2.2893478489 1 2 1
352 F  1 1.8476278580 1.2616805128 0.1138108438 6.0000000000 1.0
353A  0 2.7058312639 1.3529156319  1  1/2  1
354A  0 3.6819566662 1.8409783331  1  1/2  1
354 B  0 1.8675548347 1.2450365565  1  2/3  1
354 C  1 2.5265851358 1.1762556419 0.2327757781 2.0000000000 1.0
354D  0 1.9702699829 0.9851349914  1  1/2  1
354 E  0 0.3856294396 2.1209619178  1  11/2  1
354 F  1 3.0155788594 1.8179484925 0.0430608748 14.000000000 1.0
355A 0 2.2892784269 0.7630928090 1 1/3 1
356A  1 1.9261487706 1.4738366671 0.2550576033 3.0000000000 1.0
357A 0 0.5059809459 1.0119618919 1 2 1
357 B  1 1.3908121474 1.4226357062 0.2557203194 4.0000000000 1.0
357 C 0 1.5730848489 3.1461696978 1 2 1
357D  1 2.5259384793 1.0297863326 0.0291203318 14.000000000 1.0
358A  0 1.4369776837 1.4369776837  1  1  1
358 B  0 4.8020823416 1.6006941139  1  1/3  1
359A  1 5.2576534953 1.6996723486 0.3232758397 1.0000000000 1.0
359 B  1 5.4008701535 1.2244318944 0.2267101152 1.0000000000 1.0
360A  0 1.3930826876 1.3930826876  1  1  1
360 B  0 1.4341648133 1.4341648133  1  1  1
360 C  0 1.5689797603 1.5689797603  1  1  1
360D  0 1.6146507705 1.6146507705  1  1  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
360 E  1 2.3312316373 1.5940059578 0.6837612927 1.0000000000 1.0
361A  1 4.1905500198 1.5194236564 0.1812916740 2.0000000000 1.0
361 B 0 0.9468199298 1.8936398596 1 2 1
362A  1 5.3424976181 1.2148757892 0.2273984709 1.0000000000 1.0
362 B  1 2.4995552224 1.8658498774 0.1066389652 7.0000000000 1.0
363A  0 1.6550761880 0.4137690470  1  1/4  1
363 B  0 2.7390143163 2.7390143163  1  1  1
363 C  0 0.7861735761 0.7861735761  1  1  1
364A  1 1.9913710109 1.5755626644 0.0527463292 15.000000000 1.0
364 B  1 3.4220544534 1.3982710251 0.1362019068 3.0000000000 1.0
366A  0 0.6308411291 2.5233645163  1  4  1
366 B  0 2.4635740364 2.4635740364  1  1  1
366 C  0 0.4340530637 1.3021591910  1  3  1
366D  0 0.2600804041 1.8205628289  1  7  1
366 E  0 1.5897058463 0.7948529232  1  1/2  1
366 F  1 2.7041672516 1.3650563331 0.3785979766 1.3333333333 1.0
366G  1 2.8119685919 1.8579940284 0.0330372472 20.000000000 1.0
368A  1 1.9950448236 1.6292204503 0.8166335067 1.0000000000 1.0
368 B  0 1.8184117667 1.8184117667  1  1  1
368 C  0 1.6505359739 1.6505359739  1  1  1
368D  1 2.3725142889 1.6792666204 0.7078004243 1.0000000000 1.0
368 E  1 3.0187971397 1.5065697188 0.4990629211 1.0000000000 1.0
368 F 0 2.1965830501 2.1965830501 1 1 1
368G  1 4.9462587640 1.2657315052 0.2558967425 1.0000000000 1.0
369A  1 2.4151226244 1.5724499828 0.3255424728 2.0000000000 1.0
369 B 0 0.7651091552 3.0604366208 1 4 1
370A  1 4.2831069879 1.2956210363 0.6049912085 0.5000000000 1.0
370 B  0 1.5799277405 1.5799277405  1  1  1
370 C  0 1.6518622652 0.5506207551  1  1/3  1
370D  0 1.6806015939 1.6806015939  1  1  1
371A  1 0.9763159406 1.8303154738 0.9373581839 2.0000000000 1.0
371 B 0 1.0113136188 3.0339408564 1 3 1
372A  1 4.2046190818 1.4965237117 0.0593206219 6.0000000000 1.0
372 B  0 3.3409804579 1.6704902290  1  1/2  1
372 C  0 0.3199701361 1.9198208165  1  6  1
372D  1 3.0344782146 1.6984822680 0.0466439958 12.000000000 1.0
373A  1 3.9392451210 1.1341580880 0.2879125450 1.0000000000 1.0
374A  1 2.1703306562 1.3150843335 0.6059373164 1.0000000000 1.0
377A  1 5.3853739690 1.9439778472 1.4438944136 0.2500000000 1.0
378A  0 2.1727069014 2.1727069014  1  1  1
378 B  0 3.2456774250 1.0818924750  1  1/3  1
378 C  0 1.1058292241 2.2116584483  1  2  1
378D  1 3.3687530822 1.3035890492 0.0644941426 6.0000000000 1.0
378 E 0 1.1994469958 2.3988939916 1 2 1
378 F  1 4.3724105667 1.2660299663 1.3029734425 0.2222222222 1.0
378G  0 0.4860952950 2.4304764752  1  5  1
378H  0 0.7591617028 0.7591617028  1  1  1
380A  1 2.9974122712 1.6365169446 1.0919531893 0.5000000000 1.0
380 B 0 1.3073814431 1.9610721647 1 3/2 1
381A  1 2.6366565023 1.6669090042 0.1264411199 5.0000000000 1.0
381 B  0 3.3176310732 3.3176310732  1  1  1
384A  0 3.5791319964 1.7895659982  1  1/2  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
384 B  0 2.5308285054 1.2654142527  1  1/2  1
384 C  0 3.3922393877 1.6961196939  1  1/2  1
384D  1 4.7973509489 1.5338705503 0.6394656412 0.5000000000 1.0
384 E  0 1.3847627016 2.0771440525  1  3/2  1
384 F  0 2.9677994642 1.4838997321  1  1/2  1
384G  0 1.9583501933 0.9791750967  1  1/2  1
384H  1 4.1971022527 1.7104633501 0.2716895685 1.5000000000 1.0
385A  1 2.3974795614 1.2551027987 1.0470185598 0.5000000000 1.0
385 B  1 3.0431080851 1.0141520788 0.3332619317 1.0000000000 1.0
387A 0 0.6570811277 1.3141622553 1 2 1
387 B  1 1.1323623368 1.9788330815 0.8737632016 2.0000000000 1.0
387 C  1 4.3310513612 1.2498477542 0.1442891864 2.0000000000 1.0
387D  0 2.7905613828 0.6976403457  1  1/4  1
387 E  0 1.5740674722 3.1481349443  1  2  1
389A  2 4.9804251217 0.7593165003 0.1524601779 1.0000000000 1.0
390A  1 4.0725001283 1.1966774321 0.2938434363 1.0000000000 1.0
390 B  0 1.9598275838 1.9598275838  1  1  1
390 C  0 2.4442145217 2.4442145217  1  1  1
390D  0 0.4686191249 1.4058573748  1  3  1
390 E  0 1.8466374169 1.8466374169  1  1  1
390 F  0 0.8835342653 0.8835342653  1  1  1
390G  0 1.3107516519 1.3107516519  1  1  1
392A  1 0.8678863534 1.6420053999 1.8919590029 1.0000000000 1.0
392 B 0 0.9021374286 1.8042748572 1 2 1
392 C  1 3.5611188974 1.5286009201 0.0715412283 6.0000000000 1.0
392D  0 1.2749543703 1.2749543703  1  1  1
392 E  0 1.1107639394 2.2215278788  1  2  1
392 F  1 5.0380294438 1.3056845741 0.1295828646 2.0000000000 1.0
395A  0 3.2068928320 0.8017232080  1  1/4  1
395 B  0 0.9401374803 1.4102062205  1  3/2  1
395 C  0 3.1249773129 0.6249954626  1  1/5  1
396A  0 0.4597228734 1.3791686201  1  3  1
396 B  1 1.7552831658 1.6410582466 0.3116416919 3.0000000000 1.0
396 C  0 1.7632679755 1.7632679755  1  1  1
398A  0 2.7300308931 1.3650154466  1  1/2  1
399A  1 1.3293482923 1.8881722279 2.8407487170 0.5000000000 1.0
399 B  1 2.5299798485 1.1285450388 0.8921375713 0.5000000000 1.0
399 C 0 2.6662366521 1.3331183261 1 1/2 1
400A  1 1.8057642615 1.6854886296 0.9333935030 1.0000000000 1.0
400 B 0 0.8930706751 1.7861413502 1 2 1
400 C  1 1.9969667383 1.5552187610 0.0648992099 12.000000000 1.0
400D  0 4.1418019047 2.0709009524  1  1/2  1
400 E  0 2.0340751908 1.0170375954  1  1/2  1
400 F  0 1.8522701217 0.9261350608  1  1/2  1
400G  0 1.1310974387 2.2621948774  1  2  1
400H  1 2.5292107621 1.2987503631 0.1283750629 4.0000000000 1.0
402A  1 1.5449271648 1.2440174086 0.4026136108 2.0000000000 1.0
402 B  0 2.8944959015 1.4472479508  1  1/2  1
402 C  0 4.1774362503 2.0887181252  1  1/2  1
402D  1 2.1211176461 1.4143116144 0.3333883005 2.0000000000 1.0
404A  1 3.3748684624 1.6772917538 0.1656649015 3.0000000000 1.0
404 B  0 3.7312884804 1.2437628268  1  1/3  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
405A  0 4.0159643401 1.3386547800  1  1/3  1
405 B  1 4.4575296500 1.5847069791 1.0665371429 0.3333333333 1.0
405 C  1 4.3122245542 2.0170136488 0.4677431853 1.0000000000 1.0
405D  1 1.3820485348 1.2688418437 0.3060292534 3.0000000000 1.0
405 E 0 2.9578666342 2.9578666342 1 1 1
405 F  1 3.6601877915 0.9965850007 0.2722770135 1.0000000000 1.0
406A  1 1.6875693147 1.3611714716 0.8065870004 1.0000000000 1.0
406 B  1 1.7971708524 1.4272791044 0.5956358166 1.3333333333 1.0
406 C  1 3.0327084838 1.9468317637 0.0401215566 16.000000000 1.0
406D  0 0.3392055689 1.6960278446  1  5  1
408A  0 1.8120385466 1.8120385466  1  1  1
408 B  0 3.6474030320 1.8237015160  1  1/2  1
408 C  0 0.7343586417 1.4687172834  1  2  1
408D  1 2.4678501327 1.7688362275 0.0358375941 20.000000000 1.0
410A  1 3.2967108102 1.3868548095 0.4206783335 1.0000000000 1.0
410 B  0 0.7852065211 2.3556195632  1  3  1
410 C  0 2.2878165418 0.7626055139  1  1/3  1
410D  1 2.6404517311 1.8491499415 0.1750789382 4.0000000000 1.0
414A  0 0.5627606669 2.2510426675  1  4  1
414 B  0 1.1633580465 2.3267160931  1  2  1
414 C  1 1.3905616429 1.3266055581 0.4770035060 2.0000000000 1.0
414D  1 2.0997210460 2.0793639154 0.0990304840 10.000000000 1.0
415A  0 0.7384429369 2.9537717476  1  4  1
416A  0 1.9071354957 1.9071354957  1  1  1
416 B  1 3.3952295292 1.5990341270 0.2354824782 2.0000000000 1.0
417A  0 1.7339868091 1.7339868091  1  1  1
418A  0 4.8048009610 2.4024004805  1  1/2  1
418 B  1 1.2722415997 1.9863516582 0.0600500257 26.000000000 1.0
418 C  0 1.5273830792 3.0547661583  1  2  1
420A  0 0.7540181380 1.1310272070  1  3/2  1
420 B  0 2.6795163333 1.3397581666  1  1/2  1
420 C  0 3.4562422219 1.7281211110  1  1/2  1
420D  0 3.6614886666 1.8307443333  1  1/2  1
422A  1 2.1324420574 1.4027291428 0.3289020534 2.0000000000 1.0
423A  1 2.9332316212 1.6367929761 0.1395042386 4.0000000000 1.0
423 B 0 1.9670814874 1.9670814874 1 1 1
423 C  1 1.0527165607 2.0430649788 1.9407550475 1.0000000000 1.0
423D  0 1.5929150000 3.1858300000  1  2  1
423 E  0 1.5476958786 3.0953917572  1  2  1
423 F  1 3.1909530365 1.0465381336 0.1639851984 2.0000000000 1.0
423G  1 4.8510516054 0.9620915002 0.0991631896 2.0000000000 1.0
425A  1 2.7675003964 2.0769440878 1.5009530553 0.5000000000 1.0
425 B  1 2.2952233022 1.9443756342 0.2823800241 3.0000000000 1.0
425 C  1 5.1322753273 1.4080433297 0.2743507002 1.0000000000 1.0
425D  1 1.2501339247 1.0183803087 1.6292339382 0.5000000000 1.0
426A 0 2.6994377236 2.6994377236 1 1 1
426 B  1 1.9951714954 1.2152039603 0.6090724347 1.0000000000 1.0
426 C  0 0.9108770414 1.5181284024  1  5/3  1
427A  0 2.1028874777 2.1028874777  1  1  1
427 B  1 5.3267648633 2.1617002677 0.4058186016 1.0000000000 1.0
427 C  1 2.0761302548 1.4102148914 0.6792516453 1.0000000000 1.0
428A  0 0.6740067866 2.0220203597  1  3  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
428 B  1 2.6164175615 1.6383190525 0.2087229343 3.0000000000 1.0
429A  1 3.2842888785 1.1462496668 0.6980200032 0.5000000000 1.0
429 B  1 2.5841361086 1.3666547477 1.0577265982 0.5000000000 1.0
430A  1 4.7241011000 1.3745515859 0.2909657429 1.0000000000 1.0
430 B  1 1.7919479982 1.4065602885 0.1569867306 5.0000000000 1.0
430 C  1 2.4806272616 1.8882295645 0.7611903625 1.0000000000 1.0
430D  1 1.3842895617 1.9231655442 0.0185237308 75.000000000 1.0
431A  1 2.4239283338 1.4372881309 0.5929581790 1.0000000000 1.0
431 B  0 1.3899255898 1.3899255898  1  1  1
432A  0 1.5299540371 1.5299540371  1  1  1
432 B  1 1.9276212967 1.7360954879 0.4503206856 2.0000000000 1.0
432 C 0 0.7563848962 1.5127697924 1 2 1
432D  1 2.4062471328 1.7185974478 0.0595185973 12.000000000 1.0
432 E 0 0.8924581010 1.7849162020 1 2 1
432 F  1 1.8227448642 1.6865597223 0.2313214202 4.0000000000 1.0
432G  0 1.9090528016 1.9090528016  1  1  1
432H  0 1.2616556796 1.2616556796  1  1  1
433A  2 4.2147101930 0.9470207809 0.2246941634 1.0000000000 1.0
434A  1 2.9955292798 1.3951818152 0.9315093827 0.5000000000 1.0
434 B  0 2.8187709466 2.8187709466  1  1  1
434 C  0 3.0097830443 3.0097830443  1  1  1
434D  1 1.8196638478 1.8789054223 0.2065112658 5.0000000000 1.0
434 E  0 0.3423513497 1.0270540490  1  3  1
435A  0 4.4008169706 1.4669389902  1  1/3  1
435 B  0 0.8094965277 0.8094965277  1  1  1
435 C  0 4.7719988507 2.3859994254  1  1/2  1
435D  0 2.0907731352 1.0453865676  1  1/2  1
437A  1 1.7599083319 1.8940046259 0.2690487612 4.0000000000 1.0
437 B  0 1.8460399927 3.6920799854  1  2  1
438A  0 0.8715299494 2.6145898483  1  3  1
438 B  0 2.5149090457 2.5149090457  1  1  1
438 C  1 3.3565130070 1.2587504610 0.3750173047 1.0000000000 1.0
438D  1 1.4530902095 1.5258264643 1.5750843832 0.6666666667 1.0
438 E 0 1.4191115085 1.4191115085 1 1 1
438 F  1 3.0391118606 2.0220564891 0.6653445420 1.0000000000 1.0
438G  1 3.3567264352 1.4368065918 0.2140190182 2.0000000000 1.0
440A  1 1.9276140142 1.7340332813 0.8995749504 1.0000000000 1.0
440 B  1 2.1964080283 1.7346746206 0.7897779457 1.0000000000 1.0
440 C  0 2.2356730543 1.6767547907  1  3/4  1
440D  0 0.8303368442 2.4910105327  1  3  1
441A  0 0.6045886821 1.2091773641  1  2  1
441 B  1 2.7705733999 1.6517711259 0.8942757802 0.6666666667 1.0
441 C  1 0.7875316161 2.0779091177 1.3192544116 2.0000000000 1.0
441D  1 2.9531824110 1.2945586181 0.4383605338 1.0000000000 1.0
441 E 0 0.4189900774 0.8379801549 1 2 1
441 F  1 3.2597903746 0.9944972960 0.0762700344 4.0000000000 1.0
442A 0 2.4942559031 2.4942559031 1 1 1
442 B  1 1.3616952016 2.1459321167 0.1313272428 12.000000000 1.0
442 C  0 1.7613965761 1.7613965761  1  1  1
442D  0 2.7807390608 2.7807390608  1  1  1
442 E  0 0.2845834364 3.1304178002  1  11  1
443A  1 3.9135658341 1.7609825329 0.4499688028 1.0000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
443 B  1 3.6564568242 1.0212452670 0.2792991456 1.0000000000 1.0
443 C  0 1.5792505220 1.5792505220  1  1  1
444A  0 2.5015053363 1.2507526681  1  1/2  1
444 B  1 3.1314379361 1.8584060832 0.1978224404 3.0000000000 1.0
446A  1 3.9771573679 1.2749242492 0.1602808402 2.0000000000 1.0
446 B  1 2.0484809659 2.0453212377 0.0713183947 14.000000000 1.0
446 C 0 1.9305232636 2.8957848955 1 3/2 1
446D  2 4.8297343529 0.9402826047 0.0973430976 2.0000000000 1.0
448A  1 2.4735961738 1.7234498942 0.6967385835 1.0000000000 1.0
448 B  1 1.6236666926 1.7358759869 1.0691085768 1.0000000000 1.0
448 C  0 2.1015304995 2.1015304995  1  1  1
448D  0 2.0546257720 2.0546257720  1  1  1
448 E  0 2.3852212186 2.3852212186  1  1  1
448 F  0 0.9372638440 0.9372638440  1  1  1
448G  1 2.4289383121 1.4865234745 0.6120054458 1.0000000000 1.0
448H  0 1.3407014907 1.3407014907  1  1  1
450A  0 1.1492430291 2.2984860582  1  2  1
450 B  0 2.3058985678 2.3058985678  1  1  1
450 C  1 2.5697855357 1.4111308701 0.1372809959 4.0000000000 1.0
450D  0 1.0312291894 1.0312291894  1  1  1
450 E  0 1.1001165420 2.2002330841  1  2  1
450 F  1 1.7759273414 1.4100767515 0.1984986546 4.0000000000 1.0
450G 0 0.5981911141 1.1963822281 1 2 1
451A  1 2.8355647891 1.7563718021 0.3097040507 2.0000000000 1.0
455A  1 2.3100747043 2.1253916593 1.8401064307 0.5000000000 1.0
455 B  1 4.2935157508 1.3274338885 2.4733742054 0.1250000000 1.0
456A  0 3.3984495514 1.6992247757  1  1/2  1
456 B  0 1.3176900889 1.9765351334  1  3/2  1
456 C  1 2.4058503309 1.8547501445 0.0321222210 24.000000000 1.0
456D  1 1.4353571813 1.6586130651 0.0962950248 12.000000000 1.0
458A  1 4.4546212951 1.0227700195 0.1147987620 2.0000000000 1.0
458 B  1 2.5233506473 2.0857010259 0.0826560125 10.000000000 1.0
459A  1 2.3708814092 2.1304937413 0.8986083121 1.0000000000 1.0
459 B  1 2.1438415359 0.9525608247 0.2221621348 2.0000000000 1.0
459 C  0 1.5234809750 1.5234809750  1  1  1
459D  0 2.8921721983 2.8921721983  1  1  1
459 E  0 1.6822303161 3.3644606323  1  2  1
459 F  0 3.0444866762 1.0148288921  1  1/3  1
459G  0 0.9552159908 0.9552159908  1  1  1
459H  1 2.4618961763 1.3287697414 0.1799114241 3.0000000000 1.0
460A  0 1.3854698570 1.3854698570  1  1  1
460 B  0 1.1935074150 2.3870148301  1  2  1
460 C  1 1.5839825779 1.9113524379 0.6033375823 2.0000000000 1.0
460D  1 4.0282816130 1.6666314043 0.0689554325 6.0000000000 1.0
462A  1 1.4946342423 1.2866215632 0.4304135175 2.0000000000 1.0
462 B 0 1.0018600266 1.0018600266 1 1 1
462 C  1 2.4613024381 1.2390297777 1.0068082317 0.5000000000 1.0
462D 0 0.3229321592 1.2917286370 1 4 1
462 E  1 1.2302485152 2.0363867119 0.0394110599 42.000000000 1.0
462 F  0 1.3789297070 2.7578594140  1  2  1
462G  0 1.3136031374 2.6272062748  1  2  1
464A  1 2.2740483412 1.8709794251 0.4113763527 2.0000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
464 B  1 3.6733647241 1.6722315624 0.2276157812 2.0000000000 1.0
464 C  0 0.9667176524 1.9334353048  1  2  1
464D  0 1.5984880757 1.5984880757  1  1  1
464 E  0 1.3661402106 0.6830701053  1  1/2  1
464 F  0 2.5655588249 2.5655588249  1  1  1
464G  0 1.1118048150 2.2236096300  1  2  1
465A  1 2.9030659041 2.0294354736 1.3981325541 0.5000000000 1.0
465 B  1 2.6840015689 1.4675682335 2.1871346879 0.2500000000 1.0
466A  0 3.1242578300 1.5621289150  1  1/2  1
466 B  0 3.9592169668 2.6394779779  1  2/3  1
467A  1 5.1775927316 1.2788013566 0.2469876298 1.0000000000 1.0
468A  0 0.6621220594 1.9863661783  1  3  1
468 B  0 1.2989007218 1.2989007218  1  1  1
468 C  1 3.2358344502 1.7484928207 0.1801176634 3.0000000000 1.0
468D  0 1.5799514360 1.5799514360  1  1  1
468 E  0 1.8269518880 1.8269518880  1  1  1
469A  1 1.6007144150 2.2667465654 1.4160843084 1.0000000000 1.0
469 B  1 5.2760385039 0.9096891283 0.1724189707 1.0000000000 1.0
470A  1 3.5287956897 1.5542574208 0.2202249092 2.0000000000 1.0
470 B 0 2.0374386103 1.3582924069 1 2/3 1
470 C  1 2.1318477419 1.3213107468 0.0442711443 14.000000000 1.0
470D 0 3.9537193611 2.6358129074 1 2/3 1
470 E  1 4.4113118028 2.1138922125 0.1197995238 4.0000000000 1.0
470 F  1 1.6512381529 1.8346862509 0.0264546976 42.000000000 1.0
471A  1 3.5535684064 1.1344335682 0.1596189293 2.0000000000 1.0
472A  1 3.2876310754 1.3378014267 0.2034597855 2.0000000000 1.0
472 B  0 0.5854786616 1.1709573233  1  2  1
472 C  0 2.3105577484 2.3105577484  1  1  1
472D  0 1.1381594447 2.2763188895  1  2  1
472 E  1 2.7652148704 1.6407951896 0.1483424676 4.0000000000 1.0
473A  1 2.3797197308 1.1745884799 0.2467913479 2.0000000000 1.0
474A  1 1.1990226570 1.3453488048 0.5610189253 2.0000000000 1.0
474 B  1 3.0414875397 1.5313917147 0.0503500900 10.000000000 1.0
475A 0 1.8243091183 1.8243091183 1 1 1
475 B  1 1.6025344539 2.1875734114 2.7301421271 0.5000000000 1.0
475 C  1 3.5833759752 1.3360934191 0.7457176854 0.5000000000 1.0
477A  1 1.7789208762 2.1819346902 1.2265496006 1.0000000000 1.0
480A  1 3.1797233168 1.6466507576 1.0357195225 0.5000000000 1.0
480 B  0 2.6833296776 1.3416648388  1  1/2  1
480 C  0 3.4874928122 1.7437464061  1  1/2  1
480D  0 1.2325760765 1.8488641147  1  3/2  1
480 E  0 2.0939543480 1.0469771740  1  1/2  1
480 F  1 3.2610572384 1.6836136414 1.0325569399 0.5000000000 1.0
480G  0 3.8220157083 1.9110078541  1  1/2  1
480H  0 2.0395949022 2.0395949022  1  1  1
481A  1 2.6783175658 2.1620581228 3.2289794914 0.2500000000 1.0
482A  1 0.9101999656 1.1364955128 0.6243108964 2.0000000000 1.0
483A  0 0.7534884814 3.7674424072  1  5  1
483 B  0 3.4388742008 3.4388742008  1  1  1
484A  1 0.9208366680 1.9006792135 0.5160196372 4.0000000000 1.0
485A 0 1.5708346942 0.5236115647 1 1/3 1
485 B  1 4.5625314551 1.7297914316 0.3791297547 1.0000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
486A  1 2.8478067545 1.4572284936 0.2558510143 2.0000000000 1.0
486 B  1 3.0412502685 1.3830920358 0.4547774480 1.0000000000 1.0
486 C  0 3.7142083977 1.2380694659  1  1/3  1
486D  0 1.1331617992 2.2663235984  1  2  1
486 E  0 2.6410373364 2.6410373364  1  1  1
486 F  1 2.4821083008 2.2536351937 0.3026506664 3.0000000000 1.0
490A  1 1.1268749665 1.5859684246 2.1111061188 0.6666666667 1.0
490 B  0 1.4955620274 1.4955620274  1  1  1
490 C  0 0.7299718606 0.7299718606  1  1  1
490D  1 2.9268743131 1.3457322218 0.2298923831 2.0000000000 1.0
490 E  0 1.5212992086 1.5212992086  1  1  1
490 F  0 1.6419298285 3.2838596569  1  2  1
490G  1 2.2143485488 1.9926925955 0.0899900152 10.000000000 1.0
490H  0 1.1848208922 2.3696417844  1  2  1
490 I  0 1.0309311849 3.0927935547  1  3  1
490 J  0 0.3071649459 3.0716494587  1  10  1
490K  0 0.7046660037 1.4093320074  1  2  1
492A  1 3.5983226104 1.6799595493 0.1556243220 3.0000000000 1.0
492 B  1 1.3947922133 1.9348232249 0.0513769139 27.000000000 1.0
493A 0 0.4817702232 0.4817702232 1 1 1
493 B  1 2.2243974247 0.9092472733 0.0681268601 6.0000000000 1.0
494A  1 2.0578845874 1.3430728091 0.3263236474 2.0000000000 1.0
494 B  0 2.7476356194 1.3738178097  1  1/2  1
494 C  0 0.8534817324 1.7069634647  1  2  1
494D  1 1.3176510859 2.1566805189 0.0209841213 78.000000000 1.0
495A  1 1.9875553780 1.3104268430 1.3186317800 0.5000000000 1.0
496A  1 3.7499429781 1.7858094939 0.4762231064 1.0000000000 1.0
496 B  0 2.3224405828 2.3224405828  1  1  1
496 C  0 2.3037511398 2.3037511398  1  1  1
496D  0 1.8977267714 1.8977267714  1  1  1
496 E  1 5.2038879824 1.8742408437 0.3601616426 1.0000000000 1.0
496 F  1 1.1195541660 1.7961902528 1.6043799463 1.0000000000 1.0
497A  1 1.5344348416 2.0670876478 0.2694265787 5.0000000000 1.0
498A 0 3.2946394322 1.6473197161 1 1/2 1
498 B  1 2.6505109415 1.5703804737 0.0592482170 10.000000000 1.0
501A 0 2.6222246447 1.3111123223 1 1/2 1
503A  1 1.0074334168 2.3519086984 2.3345549783 1.0000000000 1.0
503 B  0 2.9188966226 2.9188966226  1  1  1
503 C  0 0.6270525696 0.6270525696  1  1  1
504A  1 3.5009394562 1.8034162571 0.2575617602 2.0000000000 1.0
504 B  0 1.7758299335 1.7758299335  1  1  1
504 C  0 1.3257183031 1.3257183031  1  1  1
504D  0 0.8492127775 1.6984255550  1  2  1
504 E  1 4.3429909590 1.8193359362 0.4189131300 1.0000000000 1.0
504 F  1 3.1386213067 1.8042640647 1.1497175915 0.5000000000 1.0
504G  0 0.6917988205 1.3835976409  1  2  1
504H  0 1.9475249698 1.9475249698  1  1  1
505A  1 5.2536146481 2.2232482832 1.6927379963 0.2500000000 1.0
506A  1 1.8186526896 1.2018688781 0.6608567348 1.0000000000 1.0
506 B  0 0.8951608921 0.8951608921  1  1  1
506 C  0 3.2096550026 1.0698850009  1  1/3  1
506D  1 1.8611497781 1.4567809076 0.1565463376 5.0000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
506 E  1 3.5504735863 2.2952032476 0.2154832956 3.0000000000 1.0
506 F  1 2.6021500295 2.0097923473 0.0594121821 13.000000000 1.0
507 A  1 1.3267718509 2.0594887788 0.2587092344 6.0000000000 1.0
507 B  1 4.7837439392 1.2172344104 0.1272261252 2.0000000000 1.0
507 C  1 0.9171278260 1.1623161893 5.0693748738 0.2500000000 1.0
510 A  0 0.8377889603 0.8377889603  1  1  1
510 B  0 0.4600038552 1.3800115656  1  3  1
510 C  0 1.9361123184 1.9361123184  1  1  1
510 D  1 2.1234819095 2.1812264077 0.3423977694 3.0000000000 1.0
510 E  0 2.0809871839 2.0809871839  1  1  1
510 F  0 2.5858436071 2.5858436071  1  1  1
510 G  0 0.9466241610 2.8398724830  1  3  1
513 A  1 0.9183260617 2.2618541806 2.4630186107 1.0000000000 1.0
513 B  1 4.0784452383 1.3431909599 0.1097796571 3.0000000000 1.0
514 A  1 1.5692657075 2.3372236738 1.4893740829 1.0000000000 1.0
514 B  1 3.7592158470 2.0083555695 0.5342485378 1.0000000000 1.0
516 A 0 1.5157563762 1.5157563762 1 1 1
516 B  1 1.3986133273 1.6697886091 0.1989814455 6.0000000000 1.0
516 C  0 1.2281719842 1.8422579763  1  3/2  1
516 D  0 0.7668761526 2.3006284579  1  3  1
517 A  0 1.5383608886 3.0767217772  1  2  1
517 B  0 1.1898355917 2.3796711833  1  2  1
517 C  1 0.5994133999 2.6598825791 0.3697896671 12.000000000 1.0
520 A  1 3.9206170977 1.8629119109 0.9503156592 0.5000000000 1.0
520 B 0 2.2507080525 2.2507080525 1 1 1
522 A  1 1.0344899410 1.5670842850 0.7574188124 2.0000000000 1.0
522 B  0 1.4203697590 1.4203697590  1  1  1
522 C  0 1.1900744638 0.7933829759  1  2/3  1
522 D  0 0.6150738882 1.2301477764  1  2  1
522 E  1 2.6723250627 1.4761194092 0.1380931749 4.0000000000 1.0
522 F  1 1.1162693937 1.4521616721 0.6504530539 2.0000000000 1.0
522 G  0 0.2048719257 2.2535911826  1  11  1
522 H  0 3.8963687108 2.5975791405  1  2/3  1
522 I  1 2.8948486012 2.3142517113 0.0799437909 10.000000000 1.0
522 J  1 1.6391662953 2.3288102501 0.0273217017 52.000000000 1.0
522 K  0 2.1298310269 2.1298310269  1  1  1
522 L  0 1.2838016184 2.5676032368  1  2  1
522M  0 0.1265100626 2.7832213780  1  22  1
524 A  1 3.3330958841 1.9866907710 0.5960496908 1.0000000000 1.0
525 A  1 2.6222161011 1.2004647677 1.8312217169 0.2500000000 1.0
525 B 0 1.6139595394 1.6139595394 1 1 1
525 C  1 1.6844284064 2.1137948119 2.5098066546 0.5000000000 1.0
525 D  1 3.7664964200 1.5211195389 0.2692368662 1.5000000000 1.0
528 A  1 2.9816925531 1.7218133021 0.5774617173 1.0000000000 1.0
528 B  0 1.8534676594 0.9267338297  1  1/2  1
528 C  0 1.7314419103 1.7314419103  1  1  1
528 D  0 4.0963917014 2.0481958507  1  1/2  1
528 E  0 3.0402396248 1.5201198124  1  1/2  1
528 F  0 0.9402796053 0.9402796053  1  1  1
528 G  1 1.5635201774 1.7226781594 1.1017946454 1.0000000000 1.0
528 H  1 2.7446333575 1.9892866004 0.2415971269 3.0000000000 1.0
528 I  0 0.7962633741 1.9906584352  1  5/2  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
528 J  0 2.1940597110 2.1940597110  1  1  1
530A  0 0.9734826979 1.2979769306  1  4/3  1
530 B  1 3.5353430676 1.5252750504 0.8628724405 0.5000000000 1.0
530 C  1 0.6481692597 1.0573504270 0.0815643762 20.000000000 1.0
530D  1 2.2585592113 2.2262282010 0.0821404264 12.000000000 1.0
532A 0 2.7311532120 1.3655766060 1 1/2 1
534A  1 3.3954589269 2.2001094030 0.2159854726 3.0000000000 1.0
537A  0 1.5587177967 1.5587177967  1  1  1
537 B  0 0.8102552899 1.6205105797  1  2  1
537 C  0 1.9799268697 1.3199512465  1  2/3  1
537D  0 2.7531352269 2.7531352269  1  1  1
537 E  0 2.2873633818 0.9149453527  1  2/5  1
539A  0 0.2934722056 0.5869444112  1  2  1
539 B  0 1.1393038364 2.2786076728  1  2  1
539 C  1 0.6771987829 2.0049171697 1.4803018112 2.0000000000 1.0
539D  1 1.1027617077 1.2255668741 0.5556807357 2.0000000000 1.0
540A 0 4.5731234994 1.5243744998 1 1/3 1
540 B  1 2.9454449340 1.9340458009 0.6566226306 1.0000000000 1.0
540 C  1 1.8649915990 1.8854414951 0.5054825706 2.0000000000 1.0
540D  1 1.5026305749 1.8616866147 1.2389516397 1.0000000000 1.0
540 E  0 0.8192711081 1.6385422162  1  2  1
540 F  0 1.7249938232 1.7249938232  1  1  1
542A  0 0.9359576219 3.2758516767  1  7/2  1
542 B  1 3.4021967825 2.2585197861 0.0948345156 7.0000000000 1.0
544A  1 4.7941960623 1.9135747397 0.7982880611 0.5000000000 1.0
544 B  0 4.8723530805 2.4361765402  1  1/2  1
544 C  0 2.1962622352 1.0981311176  1  1/2  1
544D  0 3.2086213244 1.6043106622  1  1/2  1
544 E  0 4.8633070873 2.4316535436  1  1/2  1
544 F  0 3.0166594192 1.5083297096  1  1/2  1
545A  1 3.5241168854 2.3342244963 0.8831430482 0.7500000000 1.0
546A  0 0.7389168563 0.7389168563  1  1  1
546 B  0 1.4270848853 1.4270848853  1  1  1
546 C  1 1.7445566571 1.6107831676 0.6155463285 1.5000000000 1.0
546D  0 1.6909566492 1.6909566492  1  1  1
546 E  0 0.1340210485 2.2783578242  1  17  1
546 F  0 0.3816525370 2.6715677591  1  7  1
546G  0 2.9547312604 2.9547312604  1  1  1
549A  1 2.9764069065 2.3235893668 1.5613385131 0.5000000000 1.0
549 B  1 1.5545806290 1.3699084867 1.7624154851 0.5000000000 1.0
549 C 0 1.1514737028 2.3029474055 1 2 1
550A  1 2.0671294787 1.3714836430 0.1658681347 4.0000000000 1.0
550 B  0 0.6080055832 1.2160111664  1  2  1
550 C  0 0.6304349988 0.6304349988  1  1  1
550D  0 1.4466970381 0.4822323460  1  1/3  1
550 E  0 0.9764911272 1.9529822544  1  2  1
550 F  1 0.4639646208 1.6665638073 1.7960031139 2.0000000000 1.0
550G  1 3.4565462699 1.2030087826 0.3480378067 1.0000000000 1.0
550H 0 3.2349129201 3.2349129201 1 1 1
550 I  1 1.2639033911 2.2720084494 0.0214001480 84.000000000 1.0
550 J  1 2.1835005398 1.9169774850 0.0399062600 22.000000000 1.0
550K  0 1.0374564312 2.0749128624  1  2  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
550 L  0 1.5458144854 3.0916289708  1  2  1
550M  0 0.2819391026 3.1013301282  1  11  1
551 A  1 1.9602738232 2.4701875222 0.6300618549 2.0000000000 1.0
551 B  1 3.9902199840 1.5318935051 0.1919560214 2.0000000000 1.0
551 C  1 0.3338943271 2.6025453385 0.5567512849 14.000000000 1.0
551 D  1 3.7489876608 0.7883877278 0.1051467488 2.0000000000 1.0
552 A  1 0.8208541864 1.7081772832 2.0809752957 1.0000000000 1.0
552 B  0 1.1877091685 1.1877091685  1  1  1
552 C  0 1.7517459385 1.7517459385  1  1  1
552 D  1 1.2581503271 1.8063895256 2.8715003075 0.5000000000 1.0
552 E  1 2.4465110075 2.0234563853 0.8270783900 1.0000000000 1.0
555 A  0 1.3704794284 1.3704794284  1  1  1
555 B  0 0.3400020988 1.7000104939  1  5  1
556 A  1 4.5857844464 1.9014122128 0.1382106111 3.0000000000 1.0
557 A  1 4.3192896340 2.1645043698 0.5011250815 1.0000000000 1.0
557 B 0 4.1429400648 4.1429400648 1 1 1
558 A  1 3.8035017777 1.5014219878 0.1973736409 2.0000000000 1.0
558 B  0 1.8840962993 1.2560641995  1  2/3  1
558 C  0 1.2927497983 1.2927497983  1  1  1
558 D  1 1.0317785645 1.4837330244 0.3595085892 4.0000000000 1.0
558 E 0 1.2371828219 2.4743656437 1 2 1
558 F  1 1.4723271192 2.3825303332 0.4854621576 3.3333333333 1.0
558 G  1 2.3163764160 2.4016041200 0.0370283410 28.000000000 1.0
558 H  0 1.2640616931 2.5281233863  1  2  1
560 A  0 1.7924218478 1.7924218478  1  1  1
560 B  0 0.5287383956 2.6436919780  1  5  1
560 C  0 1.1025221381 1.1025221381  1  1  1
560 D  1 1.5673707144 1.9245473164 0.6139413282 2.0000000000 1.0
560 E  1 1.0762429023 1.3838587046 0.1285823769 10.000000000 1.0
560 F  1 2.6665625486 1.7989783239 0.1124405354 6.0000000000 1.0
561 A 0 0.3054651772 0.6109303543 1 2 1
561 B  1 2.1348844998 1.9186947105 0.0898734667 10.000000000 1.0
561 C  1 3.7556570477 1.2558191146 0.0835951671 4.0000000000 1.0
561 D  0 5.2004058717 1.3001014679  1  1/4  1
562 A  0 3.9206453206 1.9603226603  1  1/2  1
563 A  2 5.1752090225 1.1345559170 0.2192290035 1.0000000000 1.0
564 A  1 1.2379453765 1.7326473476 1.3996153469 1.0000000000 1.0
564 B  1 3.0040996567 2.0285919557 0.6752745207 1.0000000000 1.0
565 A 0 1.1493097892 1.1493097892 1 1 1
566 A  1 3.8013747648 1.5506939100 0.2039648819 2.0000000000 1.0
566 B 0 2.5982764742 2.5982764742 1 1 1
567 A  1 2.0002970970 2.3242602526 0.5809787596 2.0000000000 1.0
567 B  1 2.0373477589 1.4299998225 0.1169821415 6.0000000000 1.0
568 A 0 1.6374033064 1.6374033064 1 1 1
570 A  1 2.1867251701 1.3629838038 0.6232990878 1.0000000000 1.0
570 B 0 0.7141450332 0.7141450332 1 1 1
570 C  1 2.2776827930 1.4027686580 0.2052917790 3.0000000000 1.0
570 D 0 0.2865166301 1.4325831504 1 5 1
570 E  1 1.7120662755 1.7232305643 1.0065209443 1.0000000000 1.0
570 F  0 1.5439230957 1.5439230957  1  1  1
570 G  0 3.8258404870 1.9129202435  1  1/2  1
570 H  0 2.0418363509 2.0418363509  1  1  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
570 I  0 1.1330304803 2.2660609607  1  2  1
570 J  0 0.3863130601 2.7041914208  1  7  1
570 K  0 0.6858933343 2.7435733371  1  4  1
570 L  0 0.2800031252 2.8000312519  1  10  1
570M  0 3.0009972891 3.0009972891  1  1  1
571 A  0 0.4323412563 1.7293650251  1  4  4
571 B  2 5.0953146197 0.9031605170 0.1772531403 1.0000000000 1.0
572 A  0 1.1186077536 2.2372155072  1  2  1
573 A  0 2.7728744064 1.3864372032  1  1/2  1
573 B  0 0.7774083687 3.8870418435  1  5  1
573 C  1 3.5896805447 1.1959599002 0.1110553697 3.0000000000 1.0
574 A  1 3.8864860069 1.4097851799 0.3627403205 1.0000000000 1.0
574 B  1 1.8130899302 1.8100407779 0.9983182565 1.0000000000 1.0
574 C  0 1.8417870162 1.8417870162  1  1  1
574 D  0 0.3594839537 1.0784518611  1  3  1
574 E  0 1.8962043734 1.8962043734  1  1  1
574 F  1 2.0605345766 1.6140546542 2.3499552095 0.3333333333 1.0
574 G  1 2.4854639550 2.3048347394 0.0843023414 11.000000000 1.0
574 H  1 2.7772218686 2.4117764641 0.5789422135 1.5000000000 1.0
574 I  1 0.6002081912 1.9219551260 1.0673824817 3.0000000000 1.0
574 J 0 2.1296506458 2.1296506458 1 1 1
575 A  1 4.5838545934 2.3699937601 0.5170307460 1.0000000000 1.0
575 B  1 0.8085795688 1.1252987905 0.3479245686 4.0000000000 1.0
575 C 0 2.0323726487 4.0647452974 1 2 1
575 D  1 2.0499620940 1.4098509776 0.2292483004 3.0000000000 1.0
575 E  1 4.5445233981 0.8318833192 0.0915259144 2.0000000000 1.0
576 A  1 2.9744774254 1.9430318018 0.6532346775 1.0000000000 1.0
576 B  0 1.9129209871 1.9129209871  1  1  1
576 C  0 3.2695050335 1.6347525168  1  1/2  1
576 D  0 1.3764094010 1.3764094010  1  1  1
576 E  0 1.7173153423 1.7173153423  1  1  1
576 F  0 3.9846657992 1.9923328996  1  1/2  1
576 G  0 2.3005478718 1.1502739359  1  1/2  1
576 H  1 2.1409010281 1.9024600490 1.7772517497 0.5000000000 1.0
576 I  1 1.7607876529 1.9003720950 0.5396369323 2.0000000000 1.0
578 A  0 1.0903585148 3.2710755444  1  3  1
579 A  0 2.9882076413 2.9882076413  1  1  1
579 B  1 4.0476524302 1.5828958511 0.7821303229 0.5000000000 1.0
580 A  1 2.8796164808 1.9398167218 0.4490914524 1.5000000000 1.0
580 B  1 2.0989217355 2.0014236886 0.2118996684 4.5000000000 1.0
582 A  1 2.4268265774 1.3742277699 0.5662653371 1.0000000000 1.0
582 B 0 0.3248421567 1.9490529401 1 6 1
582 C  1 2.6532549743 2.2748039425 0.1714726978 5.0000000000 1.0
582 D  0 2.5584585727 2.5584585727  1  1  1
583 A  0 1.9615186600 3.9230373200  1  2  1
583 B  0 0.5373731951 2.1494927803  1  4  1
583 C  0 0.7126191531 4.2757149188  1  6  1
585 A  1 1.7604418018 1.3938971243 0.7917882448 1.0000000000 1.0
585 B  0 1.6235990929 1.0823993953  1  2/3  1
585 C  0 1.0680848227 2.1361696453  1  2  1
585 D  1 3.6227637614 1.8522954214 0.7669401913 0.6666666667 1.0
585 E  0 0.3703609311 0.7407218623  1  2  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
585 F  1 0.8510814529 2.3595617156 5.5448552134 0.5000000000 1.0
585G  1 2.7101707231 1.0788350163 0.0995172562 4.0000000000 1.0
585H  1 2.9358589644 2.4047265041 1.6381757661 0.5000000000 1.0
585 I  1 1.1139515047 1.1749876122 0.0376711581 28.000000000 1.0
586A 0 1.9224714698 1.9224714698 1 1 1
586 B  1 1.5864971379 2.3468475653 0.0821813145 18.000000000 1.0
586 C  1 4.2827446200 2.2831695064 0.1332772386 4.0000000000 1.0
588A 0 1.0627828254 1.0627828254 1 1 1
588 B  1 0.9032890459 1.8046862614 0.6659685401 3.0000000000 1.0
588 C  1 2.7659029546 1.7240643602 0.4155519044 1.5000000000 1.0
588D  0 0.4247946359 2.1239731795  1  5  1
588 E  0 1.4059030758 2.1088546137  1  3/2  1
588 F  0 1.4860025529 1.4860025529  1  1  1
590A  0 1.0745734886 0.7163823257  1  2/3  1
590 B  0 2.6948119120 1.3474059560  1  1/2  1
590 C  1 3.1049556815 1.6137866012 0.2598727271 2.0000000000 1.0
590D  1 2.1842665685 2.1864656914 0.0278057445 36.000000000 1.0
591A  1 4.2440165034 1.6471095314 0.1940507925 2.0000000000 1.0
592A  1 2.7500416450 2.1008484303 0.7639333150 1.0000000000 1.0
592 B  0 1.9871937616 1.9871937616  1  1  1
592 C  0 2.4513893820 2.4513893820  1  1  1
592D  1 3.5284992325 2.0579305688 0.2916155614 2.0000000000 1.0
592 E  1 1.7676106702 1.8129978972 1.0256771628 1.0000000000 1.0
593A  1 4.6326474009 2.5297477726 0.5460695697 1.0000000000 1.0
593 B 0 1.2822317043 0.6411158522 1 1/2 1
594A  1 3.5551559587 1.5031473990 0.0704679540 6.0000000000 1.0
594 B  0 1.3661755860 1.3661755860  1  1  1
594 C  0 1.9745189169 0.6581729723  1  1/3  1
594D  1 1.0795971017 1.4819597787 0.1372697070 10.000000000 1.0
594 E  0 0.3224010209 2.5792081669  1  8  1
594 F  0 2.4423323193 2.4423323193  1  1  1
594G  0 0.6648978941 2.6595915765  1  4  1
594H  0 0.5152499152 2.5762495760  1  5  1
595A  0 0.9778986867 0.9778986867  1  1  1
595 B  0 0.5740270845 4.0181895917  1  7  1
595 C  0 4.2213530436 4.2213530436  1  1  1
598A  1 2.5667675804 1.5698916376 0.3058110227 2.0000000000 1.0
598 B  1 1.3807484571 0.9723774253 0.1760598428 4.0000000000 1.0
598 C 0 1.2303609822 2.4607219645 1 2 1
598D  1 0.7246534041 2.3415704004 0.0950381483 34.000000000 1.0
600A  1 2.2709404021 1.8182269343 0.8006493401 1.0000000000 1.0
600 B  1 2.2718298778 1.7882616021 0.1967864781 4.0000000000 1.0
600 C  0 1.3641047525 1.3641047525  1  1  1
600D  0 1.9288462329 1.9288462329  1  1  1
600 E  1 1.6232936555 2.1589881844 0.0158333892 84.000000000 1.0
600 F  0 1.1134814845 1.1134814845  1  1  1
600G  0 0.7259589922 1.4519179844  1  2  1
600H  0 0.6100461910 1.8301385731  1  3  1
600 I  0 1.0159932080 2.0319864160  1  2  1
602A  0 0.6308611400 0.6308611400  1  1  1
602 B  0 1.0174606853 1.0174606853  1  1  1
602 C  0 2.1063872057 2.1063872057  1  1  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
603A  0 3.7681340880 1.8840670440  1  1/2  1
603 B  0 2.3992410444 1.1996205222  1  1/2  1
603 C  0 0.2595867981 1.0383471925  1  4  1
603D  0 1.5982816107 3.1965632214  1  2  1
603 E  1 1.1635621891 2.4252104008 1.0421490246 2.0000000000 1.0
603 F  1 3.4987061444 1.0565412255 0.1509902778 2.0000000000 1.0
605A  1 0.3648079087 1.8671028100 0.3412029117 15.000000000 1.0
605 B  1 1.0379669438 1.4632185424 5.6387866729 0.2500000000 1.0
605 C  1 2.6758306612 0.9214319585 0.0688707228 5.0000000000 1.0
606A 0 1.1774603810 1.7661905715 1 3/2 1
606 B  1 2.6663147092 1.7325801440 0.3249016588 2.0000000000 1.0
606 C  0 0.9957737146 1.9915474292  1  2  1
606D  0 0.3527718822 2.4694031751  1  7  1
606 E  1 1.9676984559 2.6292883984 0.0247449124 54.000000000 1.0
606 F 0 2.8467624701 2.8467624701 1 1 1
608A  1 1.3513123907 1.9841616741 0.7341609860 2.0000000000 1.0
608 B  0 1.0430839617 2.0861679234  1  2  1
608 C  0 2.5878393778 2.5878393778  1  1  1
608D  1 3.0958399938 1.9643514437 0.3172566166 2.0000000000 1.0
608 E  1 0.5785570780 2.0903172801 0.3612983679 10.000000000 1.0
608 F  1 2.3045386410 1.4518436127 0.3149965869 2.0000000000 1.0
609A  1 3.5623621078 2.2343678812 1.2544305231 0.5000000000 1.0
609 B  1 1.3484815516 1.1844590786 1.7567301195 0.5000000000 1.0
610A 0 0.9772220217 0.9772220217 1 1 1
610 B  1 2.6389744505 1.6222091650 0.4098079754 1.5000000000 1.0
610 C  0 3.2804783161 3.2804783161  1  1  1
611A  0 4.4507748026 4.4507748026  1  1  1
612A  0 3.0101774280 2.0067849520  1  2/3  1
612 B  1 0.8947231692 1.9203816974 1.0731708776 2.0000000000 1.0
612 C  1 2.1134557877 1.9847891382 0.0782600212 12.000000000 1.0
612D 0 0.9210983643 1.8421967286 1 2 1
614A  1 3.8235505367 2.5202550314 0.1098566636 6.0000000000 1.0
614 B  1 1.6220180852 2.1964097812 1.0155912261 1.3333333333 1.0
615A  1 3.1476280915 1.2171094498 0.3866751136 1.0000000000 1.0
615 B  1 1.0766896496 2.0130725659 0.1335490665 14.000000000 1.0
616A  1 1.2592832385 2.0157852699 1.6007401736 1.0000000000 1.0
616 B  0 0.4967001346 2.4835006732  1  5  1
616 C  0 1.2228749426 1.2228749426  1  1  1
616D  1 1.7515268442 1.7957577414 0.0427188652 24.000000000 1.0
616 E  1 2.1143298453 1.9497931917 1.8443604682 0.5000000000 1.0
618A  1 3.2025259469 1.3562810365 0.2117517639 2.0000000000 1.0
618 B  1 0.3275850164 1.4815330940 4.5225911437 1.0000000000 1.0
618 C  1 4.3034232575 1.7322241586 1.2075671308 0.3333333333 1.0
618D  1 0.5996924071 1.6716285286 0.8362429684 3.3333333333 1.0
618 E  1 3.1261472585 2.3263678897 0.1488329050 5.0000000000 1.0
618 F  1 1.5379775186 2.6608279159 0.0224686033 77.000000000 1.0
618G 0 0.3846002426 3.0768019409 1 8 1
620A  1 3.5636105700 2.1477266018 1.8080482362 0.3333333333 1.0
620 B  1 1.9747591044 2.0518524948 0.1385385853 7.5000000004 1.0
620 C  1 2.3002922132 1.4718967298 0.2132912682 3.0000000000 1.0
621A 0 2.4706496111 2.4706496111 1 1 1
621 B  1 2.4850697914 1.3566125441 0.5459052091 1.0000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
622A  1 2.0911722409 2.4885586945 0.1700043535 7.0000000000 1.0
623A  1 1.6365441158 2.2881851242 0.2330301907 6.0000000000 1.0
624A  1 3.6944854092 1.8414108744 0.9968429540 0.5000000000 1.0
624 B  1 1.7240319882 1.7131634804 1.9873917563 0.5000000000 1.0
624 C  0 2.9977977348 1.4988988674  1  1/2  1
624D  0 4.1998547381 2.0999273690  1  1/2  1
624 E  0 0.9490741088 2.3726852720  1  5/2  1
624 F  1 1.9064113550 2.1165060726 2.2204085882 0.5000000000 1.0
624G  1 2.7365561607 1.8217793937 1.3314394346 0.5000000000 1.0
624H  0 2.2865886337 2.2865886337  1  1  1
624 I  0 0.3978321511 1.9891607556  1  5  1
624 J  0 3.1643734930 1.5821867465  1  1/2  1
626A  1 4.8236248257 1.5953820026 0.6614867699 0.5000000000 1.0
626 B  0 1.7509727378 1.7509727378  1  1  1
627A  0 2.0728597236 2.0728597236  1  1  1
627 B  0 0.5438530027 1.6315590080  1  3  1
628A  0 2.6439246550 2.6439246550  1  1  1
629A  1 1.7091284174 2.4969954466 1.4609759110 1.0000000000 1.0
629 B 0 2.2266969590 4.4533939180 1 2 1
629 C  1 2.2765689140 1.3037797972 0.1431737679 4.0000000000 1.0
629D  1 1.3686582300 1.5536888031 0.2270382436 5.0000000000 1.0
630A  0 3.1915635134 1.0638545045  1  1/3  1
630 B  0 1.1585165872 1.1585165872  1  1  1
630 C  0 0.4975637810 0.9951275620  1  2  1
630D  1 1.2617923560 1.5738501163 0.6236565425 2.0000000000 1.0
630 E  1 1.8098438078 1.6379676457 0.4525162997 2.0000000000 1.0
630 F  0 1.2655347079 1.2655347079  1  1  1
630G  0 0.3258351084 2.2808457589  1  7  1
630H  0 2.5822999144 2.5822999144  1  1  1
630 I  0 0.5836435418 2.3345741671  1  4  1
630 J  0 2.5079578706 2.5079578706  1  1  1
632A  1 3.2690386003 2.1533299446 0.3293521747 2.0000000000 1.0
633A  1 1.0939894596 1.1623092920 0.5312250871 2.0000000000 1.0
635A  1 2.6532748870 2.1046502583 2.3796821076 0.3333333333 1.0
635 B  1 5.1560085835 1.0641729808 0.2063947264 1.0000000000 1.0
637A  1 3.6103936643 2.4744038023 0.6853556793 1.0000000000 1.0
637 B 0 0.5482023406 2.1928093623 1 4 1
637 C  1 0.2804003378 2.4750227405 8.8267466432 1.0000000000 1.0
637D  1 1.2618475557 1.2952727037 0.5132445269 2.0000000000 1.0
639A  1 1.4159216040 1.3874418666 0.9798860775 1.0000000000 1.0
640A  1 2.5146785012 2.0316664632 3.2316917845 0.2500000000 1.0
640 B  1 5.1408789950 1.9898721132 1.5482738381 0.2500000000 1.0
640 C  0 1.7781462207 1.7781462207  1  1  1
640D  0 1.1829167593 2.3658335187  1  2  1
640 E  0 4.2937310983 2.1468655491  1  1/2  1
640 F  0 1.6728969242 0.8364484621  1  1/2  1
640G  1 3.6351503986 2.0751281923 0.5708507117 1.0000000000 1.0
640H  1 3.0361263762 1.6979739838 0.2796283444 2.0000000000 1.0
642A  0 2.3935636629 1.1967818315  1  1/2  1
642 B  0 0.8833018943 1.1777358591  1  4/3  1
642 C  1 1.3096864637 2.4034651156 0.0705825162 26.000000000 1.0
643A  2 5.0103134331 1.1482617366 0.2291796216 1.0000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
644 A  1 1.3458310330 2.1671360619 0.8051293248 2.0000000000 1.0
644 B  1 1.8677219381 1.8666034248 0.1665668558 6.0000000000 1.0
645 A  0 2.9547633309 1.4773816655  1  1/2  1
645 B  0 3.7246680737 1.8623340369  1  1/2  1
645 C  0 0.7287600670 2.9150402680  1  4  1
645 D  0 0.2060864423 0.8243457694  1  4  1
645 E  1 0.5418428107 2.1123636266 0.0406091718 96.000000000 1.0
645 F  1 2.0680590222 1.3395707765 0.0539785842 12.000000000 1.0
646 A  0 1.4274356437 1.4274356437  1  1  1
646 B  0 1.7333045886 3.4666091772  1  2  1
646 C  0 2.3277953903 2.3277953903  1  1  1
646 D  1 2.1316501109 2.5834562462 0.2019918930 6.0000000000 1.0
646 E 0 1.7417182315 1.7417182315 1 1 1
648 A  1 2.8579610545 2.0264323657 0.3545241393 2.0000000000 1.0
648 B  1 3.7739500820 1.9947552563 0.2642794967 2.0000000000 1.0
648 C 0 0.8564595017 1.7129190035 1 2 1
648 D  1 2.5144198042 2.0822444144 0.1380202046 6.0000000000 1.0
649 A  1 3.4660507043 1.6065376871 0.2317533447 2.0000000000 1.0
650 A  1 1.3995225281 1.6156045801 1.1543969802 1.0000000000 1.0
650 B  1 0.6941100694 1.9367249330 1.3951136990 2.0000000000 1.0
650 C  1 4.1558626857 1.0826851427 0.1302599754 2.0000000000 1.0
650 D  0 0.7630894957 1.5261789915  1  2  1
650 E  0 0.3964760735 0.7929521471  1  2  1
650 F  0 1.9439290266 1.9439290266  1  1  1
650 G  1 3.6999544999 1.2442250387 0.5044217593 0.6666666667 1.0
650 H  0 2.0751559918 2.0751559918  1  1  1
650 I  0 1.6546699551 3.3093399101  1  2  1
650 J  0 1.6923586570 3.3847173140  1  2  1
650 K  1 1.7063199854 2.4329160966 0.0339482478 42.000000000 1.0
650 L  0 0.3104154598 1.8624927590  1  6  1
650M  0 1.8585582941 3.7171165882  1  2  1
651 A  0 0.2759207512 1.3796037560  1  5  1
651 B  0 4.2374957336 2.1187478668  1  1/2  1
651 C  1 2.0362564170 2.6338964695 1.2934994078 1.0000000000 1.0
651 D  1 1.2854998192 1.5714303035 1.2224274792 1.0000000000 1.0
651 E 0 1.2556913761 1.2556913761 1 1 1
654 A  1 2.2676191686 1.7461630175 0.0481276530 16.000000000 1.0
654 B  1 1.3654234799 2.4192177359 0.0553678440 32.000000000 1.0
655 A  2 4.4879258049 0.8881921108 0.0989535199 2.0000000000 1.0
656 A  1 3.3657759082 2.0060295839 0.5960080643 1.0000000000 1.0
656 B  0 2.5555950990 1.2777975495  1  1/2  1
656 C  0 2.2320363680 2.2320363680  1  1  1
657 A  0 1.3920168887 1.3920168887  1  1  1
657 B  0 0.8683578148 3.4734312592  1  4  1
657 C  1 1.4732708732 1.9853109738 0.6737766320 2.0000000000 1.0
657 D  1 3.2248295382 1.3989934744 0.4338193563 1.0000000000 1.0
658 A  0 0.3453570447 0.6907140895  1  2  1
658 B  0 3.6139800621 1.8069900311  1  1/2  1
658 C  0 2.5856452314 1.7237634876  1  2/3  1
658 D  1 1.4893191366 2.4281008908 0.1358619089 12.000000000 1.0
658 E  1 0.6112087497 2.5417115238 0.1890227227 22.000000000 1.0
658 F  1 4.3216254957 2.0088664210 0.1162101172 4.0000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
659A  1 1.5987465961 2.8102618562 1.7577906737 1.0000000000 1.0
659 B  0 3.9580875305 3.9580875305  1  1  1
660A  0 1.0700232126 1.0700232126  1  1  1
660 B  1 2.9740851833 1.8332170918 0.2054656562 3.0000000000 1.0
660 C  1 2.3631542925 2.2071066960 0.9339663953 1.0000000000 1.0
660D 0 0.6405269388 1.9215808163 1 3 1
662A  1 1.0766666723 1.2847762864 0.5966453311 2.0000000000 1.0
663A 0 1.1861398733 1.1861398733 1 1 1
663 B  1 3.2047641001 1.1920969618 1.4879060356 0.2500000000 1.0
663 C  1 1.9988726759 1.6326154359 0.4083840496 2.0000000000 1.0
664A  2 3.5536274747 1.3742026761 0.0966760505 4.0000000000 1.0
664 B  1 3.6509416469 2.1908129135 0.3000339536 2.0000000000 1.0
664 C  1 4.5567302944 1.8865952753 0.2070119530 2.0000000000 1.0
665A  1 1.3794131390 1.2423862408 0.1801325804 5.0000000000 1.0
665 B  1 2.4602431252 2.5513395947 4.1481097027 0.2500000000 1.0
665 C  1 4.8049229586 2.3451929413 0.4880812786 1.0000000000 1.0
665D  1 1.0294222183 1.0781458036 0.5236655011 2.0000000000 1.0
665 E  0 0.7606298483 1.5212596966  1  2  1
666A  0 0.6115596244 1.2231192488  1  2  1
666 B  0 0.6266921957 1.2533843913  1  2  1
666 C  1 1.7584042022 1.6232934654 0.2307907168 4.0000000000 1.0
666D  1 3.7060696315 2.6092064873 0.0704036013 10.000000000 1.0
666 E  1 1.2684154139 2.5396068527 0.0385036265 52.000000000 1.0
666 F  0 1.1123286520 2.2246573039  1  2  1
666G  0 0.0666962770 3.0680287440  1  46  1
669A  1 2.0309614263 2.3967060910 1.1800844960 1.0000000000 1.0
670A  1 0.4721151649 1.6886117386 0.3251540503 11.000000000 1.0
670 B  1 2.8685877138 1.3009484555 1.3605459397 0.3333333333 1.0
670 C  1 4.0108342189 2.6312306772 0.1312061548 5.0000000000 1.0
670D  1 0.8786739264 2.2406781479 0.1342140984 19.000000000 1.0
672A  1 3.0552339984 1.8770484002 0.6143714037 1.0000000000 1.0
672 B  1 1.0195945289 2.1403725794 0.1399492654 15.000000000 1.0
672 C  0 2.9459785698 1.4729892849  1  1/2  1
672D  0 0.7784733987 0.7784733987  1  1  1
672 E  1 3.6459594937 1.8104178877 0.9931091615 0.5000000000 1.0
672 F  1 2.4672111687 2.2099943158 1.7914918219 0.5000000000 1.0
672G  0 1.9947625016 1.9947625016  1  1  1
672H  0 2.2280058144 2.2280058144  1  1  1
674A  1 2.7092586874 1.7379082664 0.6414700355 1.0000000000 1.0
674 B  1 4.0104450489 2.6033014713 0.6491303184 1.0000000000 1.0
674 C  1 0.5759572330 1.9868787305 0.1112805927 31.000000000 1.0
675A  1 2.3701946024 1.9226596103 0.4055910870 2.0000000000 1.0
675 B  1 3.7197181779 1.4725103035 0.1319553645 3.0000000000 1.0
675 C  0 3.0994098257 1.0331366086  1  1/3  1
675D  0 0.8904557232 0.8904557232  1  1  1
675 E  0 1.3860982121 1.3860982121  1  1  1
675 F  0 1.9911195281 1.9911195281  1  1  1
675G  0 1.6911045184 3.3822090368  1  2  1
675H  0 0.4397610737 0.8795221474  1  2  1
675 I  1 1.6635085406 2.5377208007 0.5085077190 3.0000000000 1.0
676A  0 0.9379794035 1.4069691052  1  3/2  1
676 B  0 1.4965418840 1.4965418840  1  1  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
676 C  0 0.4150660384 0.4150660384  1  1  1
676D  0 2.9442542341 2.9442542341  1  1  1
676 E  0 0.8165892007 2.4497676021  1  3  1
677A  1 2.8368146928 1.2893981935 0.4545232358 1.0000000000 1.0
678A  1 4.8406123729 1.5171515354 0.1567107030 2.0000000000 1.0
678 B  1 1.5883609701 1.7574538605 0.1844095783 6.0000000000 1.0
678 C  1 1.4205258825 2.4773594939 0.2491390713 7.0000000000 1.0
678D  0 1.3970457314 2.7940914629  1  2  1
678 E  0 3.1622103101 3.1622103101  1  1  1
678 F  0 1.2858801950 2.5717603900  1  2  1
680A  1 3.2750305235 2.0532909813 1.2539064699 0.5000000000 1.0
680 B  0 1.4663778907 1.4663778907  1  1  1
680 C  0 0.6189257201 2.4757028802  1  4  1
681A  1 3.8078769894 1.7148309965 0.2251689066 2.0000000000 1.0
681 B 0 0.8199178694 1.8448152061 1 9/4 9
681 C  2 3.7708461685 1.0262711474 0.1360796890 2.0000000000 1.0
681D 0 0.5238009112 2.0952036450 1 4 1
681 E  1 2.2367233352 2.0523231219 0.0917557880 10.000000000 1.0
682A  1 3.1826703234 2.2812508096 0.7167725770 1.0000000000 1.0
682 B  1 0.6115533121 2.6265637235 0.0753492204 57.000000000 1.0
684A  1 2.5117117385 2.1232510164 0.1408900408 6.0000000000 1.0
684 B  1 0.8914338511 2.0174937497 0.3772001230 6.0000000000 1.0
684 C 0 1.0106719472 2.0213438944 1 2 1
685A  1 5.0493985695 2.5294065402 0.5009322408 1.0000000000 1.0
688A  1 2.1361539012 2.0384041307 0.9542402959 1.0000000000 1.0
688 B 0 1.2461451514 2.4922903027 1 2 1
688 C  1 1.3631824182 2.3637294196 1.7339788043 1.0000000000 1.0
689A  1 5.1047223290 1.0333048176 0.8096854253 0.2500000000 1.0
690A  1 0.7448541864 1.3963979050 0.9373632655 2.0000000000 1.0
690 B  0 0.9529657858 0.9529657858  1  1  1
690 C  0 0.1132251968 0.9058015746  1  8  1
690D  0 1.2098350005 1.2098350005  1  1  1
690 E  1 0.9634951715 1.8051068282 0.7493994289 2.5000000000 1.0
690 F  0 3.0827918116 1.5413959058  1  1/2  1
690G  0 0.2784647670 1.9492533690  1  7  1
690H  1 2.3108328098 2.4704452833 0.1781785678 6.0000000000 1.0
690 I  0 0.9226753489 2.7680260467  1  3  1
690 J  0 0.6031690708 3.0158453540  1  5  1
690K  0 1.5219655531 3.0439311063  1  2  1
692A  0 2.1861975957 1.0930987979  1  1/2  1
693A  0 1.0344382277 1.0344382277  1  1  1
693 B  1 1.7403153566 1.9629786598 0.5639721136 2.0000000000 1.0
693 C  0 0.4482861989 0.8965723977  1  2  1
693D  0 1.1413329845 2.2826659690  1  2  1
696A  1 3.8717115384 1.8979933552 0.2451103777 2.0000000000 1.0
696 B 0 1.6317277401 1.6317277401 1 1 1
696 C  1 2.0763110581 2.2838622912 0.1099961531 10.000000000 1.0
696D  0 1.2519112526 1.2519112526  1  1  1
696 E  0 0.9609707865 1.9219415730  1  2  1
696 F  1 0.7587994985 1.8510015342 0.4065635999 6.0000000000 1.0
696G  1 3.6032980856 2.2393010521 0.1035764550 6.0000000000 1.0
699A  0 1.3274184293 3.9822552879  1  3  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
700 A  0 0.6011899261 1.2023798523  1  2  1
700 B  0 2.2739538827 2.2739538827  1  1  1
700 C  1 4.3423658689 2.1348487950 0.1638775466 3.0000000000 1.0
700 D  1 0.6956459498 1.5021159277 0.0359885161 60.000000000 1.0
700 E  1 0.7139819035 2.1110581354 0.9855796648 3.0000000000 1.0
700 F  1 1.9419650532 2.1076136836 0.3617664970 3.0000000000 1.0
700 G  1 3.1315375430 1.4807661532 0.0788093246 6.0000000000 1.0
700 H  0 1.5965120710 1.5965120710  1  1  1
700 I  0 1.0169430919 1.0169430919  1  1  1
700 J  0 1.4004661640 2.8009323281  1  2  1
701 A  0 4.5057330241 4.5057330241  1  1  1
702 A  1 1.2959189179 1.6511976366 0.6370759828 2.0000000000 1.0
702 B  1 3.6218545346 1.5825343783 0.4369403473 1.0000000000 1.0
702 C  0 1.5516100045 1.5516100045  1  1  1
702 D  0 1.0950637552 1.0950637552  1  1  1
702 E  0 1.1045333203 0.7363555469  1  2/3  1
702 F  0 1.1196604817 1.1196604817  1  1  1
702 G  0 1.6442531135 1.6442531135  1  1  1
702 H  1 4.4173331953 1.6516890684 3.3651981768 0.1111111111 1.0
702 I  0 2.7852340926 2.7852340926  1  1  1
702 J  0 0.2651042420 2.9161466624  1  11  1
702 K  1 2.9521289967 2.6395534641 0.0425770765 21.000000000 1.0
702 L  1 1.6844372293 2.6868354521 0.0531697947 30.000000000 1.0
702M  1 0.7927472332 2.6131420167 0.0578300306 57.000000000 1.0
702 N  0 2.4387240231 2.4387240231  1  1  1
702 O  0 2.3848948730 2.3848948730  1  1  1
702 P  0 0.4731564099 2.8389384593  1  6  1
703 A  0 1.0265530673 2.0531061346  1  2  1
703 B  1 1.7712720083 1.1006854340 0.3107048011 2.0000000000 1.0
704 A  1 4.4873325290 2.2759885635 0.5072030095 1.0000000000 1.0
704 B  1 3.8045730058 2.0086088735 0.5279459404 1.0000000000 1.0
704 C  0 2.4683463702 2.4683463702  1  1  1
704 D  0 1.7069125392 1.7069125392  1  1  1
704 E  0 3.0069924701 3.0069924701  1  1  1
704 F  0 2.1595534099 2.1595534099  1  1  1
704 G  0 1.3006681580 1.3006681580  1  1  1
704 H  0 2.6129403750 2.6129403750  1  1  1
704 I  0 1.1705612909 1.1705612909  1  1  1
704 J  1 5.1103236666 2.2490865778 0.4401064834 1.0000000000 1.0
704 K  1 2.0630782447 1.8879135472 0.9150954658 1.0000000000 1.0
704 L  1 1.6188133885 1.4443889285 0.2974172191 3.0000000000 1.0
705 A  1 0.8998713610 1.6952055621 0.9419154979 2.0000000000 1.0
705 B  1 0.7197724152 1.2855968706 0.1190743855 15.000000000 1.0
705 C 0 2.2422368953 1.4948245969 1 2/3 1
705 D  1 2.3563327671 2.7399409039 1.1627987957 1.0000000000 1.0
705 E  1 3.5400966154 1.6577969123 0.0936582863 5.0000000000 1.0
705 F 0 3.3938962532 2.5454221899 1 3/4 1
706 A  1 2.4288257338 1.9200718399 0.7905350364 1.0000000000 1.0
706 B  1 1.2043004068 2.6991718144 0.0974468626 23.000000000 1.0
706 C  1 2.9766469907 2.6216013820 1.7614459425 0.5000000000 1.0
706 D  1 2.6150443165 2.3202308347 0.3549050117 2.5000000000 1.0
707 A  2 4.3145192962 0.9738513460 0.1128574563 2.0000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
708A  0 2.0619546003 1.0309773002  1  1/2  1
709A  2 4.0733289400 1.0537016538 0.2586831727 1.0000000000 1.0
710A  1 2.1059977182 1.5321809045 0.1818830205 4.0000000000 1.0
710 B  1 1.7560060271 2.4992935440 0.0418612650 34.000000000 1.0
710 C  1 3.1589551069 2.5747640635 0.0582191619 14.000000000 1.0
710D 0 1.1567437634 2.3134875269 1 2 1
711A  1 2.5535933872 2.5771593912 0.5046142828 2.0000000000 1.0
711 B  1 1.7397204637 1.4841485905 0.4265480063 2.0000000000 1.0
711 C  0 2.3245918204 2.3245918204  1  1  1
712A  0 2.0050824245 1.0025412123  1  1/2  1
713A  1 4.2159507277 2.7924101607 0.6623441167 1.0000000000 1.0
714A  1 0.8814893885 1.5642040390 1.7745012696 1.0000000000 1.0
714 B  0 0.9622645215 0.9622645215  1  1  1
714 C  0 0.2171317499 1.0856587497  1  5  1
714D  1 2.6839654336 1.3951533217 0.5198104656 1.0000000000 1.0
714 E 0 0.3477949055 2.4345643386 1 7 1
714 F  1 1.9409723197 2.4625037273 0.8457973022 1.5000000000 1.0
714G  0 0.6275698389 1.8827095167  1  3  1
714H  0 2.5311266382 2.5311266382  1  1  1
714 I  0 0.8643306617 2.5929919852  1  3  1
715A  1 3.5289602069 1.5787090658 1.3420744128 0.3333333333 1.0
715 B  1 0.6975196333 1.2547951053 0.0856637506 21.000000000 1.0
718A 0 0.9761894668 0.9761894668 1 1 1
718 B  2 3.6847793558 1.2517811528 0.1698583595 2.0000000000 1.0
718 C  1 2.5755975942 2.6764950054 0.0865978641 12.000000000 1.0
720A  1 2.7175526609 2.0753361001 0.3818391691 2.0000000000 1.0
720 B  0 0.8280154410 1.6560308820  1  2  1
720 C  0 2.9317714525 1.4658857262  1  1/2  1
720D  0 3.4281037645 1.7140518822  1  1/2  1
720 E  1 1.4374984153 2.1527060376 1.4975362857 1.0000000000 1.0
720 F 0 0.7101221744 1.4202443487 1 2 1
720G  1 1.1463561696 2.1771249053 0.3165282837 6.0000000000 1.0
720H  1 1.6172770870 2.1029661686 0.3250782110 4.0000000000 1.0
720 I  0 3.2613074970 1.6306537485  1  1/2  1
720 J  0 0.9676241149 1.9352482298  1  2  1
722A  1 0.5289503653 1.8191706374 10.317625755 0.3333333333 1.0
722 B  1 1.5826710943 1.1653365368 0.3681549947 2.0000000000 1.0
722 C  0 0.5404948479 1.0809896957  1  2  1
722D  0 0.6600950502 3.9605703013  1  6  1
722 E  1 0.2759017297 2.5648119356 0.7746755637 12.000000000 1.0
722 F  1 3.2014095799 2.5300549410 0.2634313498 3.0000000000 1.0
723A  1 3.4502808494 1.2092337952 0.7009480376 0.5000000000 1.0
723 B  1 1.7498147728 2.1513753427 1.2294874727 1.0000000000 1.0
725A  1 2.5453515525 2.6227061923 2.0607811048 0.5000000000 1.0
726A  1 2.0448157422 1.4899240842 0.7286348855 1.0000000000 1.0
726 B  0 0.2420836944 0.9683347776  1  4  1
726 C  0 1.3230677871 1.3230677871  1  1  1
726D  1 3.5176356020 1.7815333279 0.0633072015 8.0000000000 1.0
726 E  1 0.5670099361 1.7173298337 0.3028747336 10.000000000 1.0
726 F 0 0.6987232202 2.0961696607 1 3 1
726G  1 1.0589008371 2.4891357710 0.0391779803 60.000000000 1.0
726H  0 0.9428381419 2.8285144257  1  3  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
726 I  0 0.3723785106 2.9790280849  1  8  1
728A  0 1.3003620819 1.3003620819  1  1  1
728 B  0 0.6814404408 2.7257617631  1  4  1
728 C  1 0.8260062433 2.0890611620 0.4215184367 6.0000000000 1.0
728D  1 2.2030843903 1.6802562364 0.1271139260 6.0000000000 1.0
730A  0 0.8825509340 0.8825509340  1  1  1
730 B  0 0.9049726844 0.3016575615  1  1/3  1
730 C  0 2.0285045409 2.0285045409  1  1  1
730D  0 1.1089286592 1.1089286592  1  1  1
730 E  0 1.7926088874 1.7926088874  1  1  1
730 F  1 2.5571125379 1.7537639412 0.3429188030 2.0000000000 1.0
730G  1 3.3565977387 1.1443062568 0.3409125388 1.0000000000 1.0
730H 0 1.7236786394 1.7236786394 1 1 1
730 I  1 3.5781506698 2.5255155328 0.1008308388 7.0000000000 1.0
730 J  1 1.1012771596 2.6051012065 0.0375480527 63.000000000 1.0
730K 0 3.2768778391 3.2768778391 1 1 1
731A  1 2.8737517466 2.8068624879 0.9767240651 1.0000000000 1.0
732A 0 3.2997896421 1.6498948210 1 1/2 1
732 B  1 2.7343523122 1.9306520942 0.1176788183 6.0000000000 1.0
732 C  1 2.6755394130 2.2682272678 0.1883921057 4.5000000000 1.0
733A  0 1.6195086138 1.6195086138  1  1  1
734A  0 1.3368249040 3.3420622601  1  5/2  1
735A  0 1.4373759725 1.4373759725  1  1  1
735 B  0 0.2066678812 0.4133357625  1  2  1
735 C  1 2.5974756723 1.7905882921 0.3446785491 2.0000000000 1.0
735D 0 0.7149316291 1.4298632582 1 2 1
735 E  1 1.2066457006 1.6631875266 2.7567123073 0.5000000000 1.0
735 F  1 1.2882643756 1.4518853833 0.0134167723 84.000000000 1.0
737A  1 0.8056517670 1.4537684161 0.1503718765 12.000000000 1.0
738A  1 1.3681269310 1.6904101465 0.6177826444 2.0000000000 1.0
738 B  0 0.4498240118 0.8996480237  1  2  1
738 C  0 1.5977768394 1.5977768394  1  1  1
738D  1 1.6152729786 1.6730284056 0.2589389577 4.0000000000 1.0
738 E  1 2.0318963871 2.7547337823 0.1355745204 10.000000000 1.0
738 F  1 1.7902683597 2.6751400081 0.0339606273 44.000000000 1.0
738G  0 0.9655401711 2.8966205133  1  3  1
738H  0 0.4071435598 2.8500049188  1  7  1
738 I  0 2.5773335958 2.5773335958  1  1  1
738 J  0 1.1131778064 2.2263556127  1  2  1
739A  0 3.6774435209 3.6774435209  1  1  1
740A  0 0.4224994326 2.5349965954  1  6  1
740 B  1 1.3678317161 2.3309157286 0.8520476975 2.0000000000 1.0
740 C  1 2.0445936737 2.0073801537 0.0818165886 12.000000000 1.0
741A  0 1.8564415480 1.8564415480  1  1  1
741 B  0 0.4119061199 1.2357183596  1  3  1
741 C  0 0.2794796202 3.0742758221  1  11  1
741D  0 0.1985518805 3.9710376102  1  20  1
741 E  1 2.6257324397 2.2064827886 0.1050412999 8.0000000000 1.0
742A  1 4.0625082193 1.6214759738 0.1995658699 2.0000000000 1.0
742 B  0 2.0545031092 2.0545031092  1  1  1
742 C  0 0.7444499769 1.4888999537  1  2  1
742D  0 0.2649897578 2.1199180628  1  8  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
742 E  1 0.5772565826 1.9175643082 0.3321857846 10.000000000 1.0
742 F 0 0.8960291889 3.5841167558 1 4 1
742G  1 2.1897835762 2.5093311207 0.0572963271 20.000000000 1.0
744A  1 2.4148251947 1.9176814067 0.1985321143 4.0000000000 1.0
744 B 0 1.1678014455 1.7517021682 1 3/2 1
744 C  1 1.9190973642 2.2681277304 0.0738670095 16.000000000 1.0
744D  0 0.4891399315 1.9565597260  1  4  1
744 E  0 0.9794154660 0.9794154660  1  1  1
744 F  1 1.9869542434 1.9646208882 0.0823966671 12.000000000 1.0
744G  1 3.0362477634 2.3164305927 0.0635771181 12.000000000 1.0
747A  1 1.7571979728 1.4144734403 1.6099192716 0.5000000000 1.0
747 B 0 4.5044550320 2.2522275160 1 1/2 1
747 C  1 0.5060273272 2.5853819361 2.5545872695 2.0000000000 1.0
747D  1 2.2599386817 2.7052674428 1.1970534708 1.0000000000 1.0
747 E  1 1.8087956133 1.5131984023 0.4182889408 2.0000000000 1.0
748A 0 0.5058218300 3.0349309803 1 6 1
749A  1 1.6335946125 1.6287624673 0.4985210084 2.0000000000 1.0
752A  1 2.1590990894 2.1778815538 1.0086992137 1.0000000000 1.0
753A  0 1.6329306908 3.2658613816  1  2  1
753 B  0 2.8471750728 1.8981167152  1  2/3  1
753 C  1 2.6391949788 2.1958740551 0.2080060466 4.0000000000 1.0
754A 0 2.4638722502 1.6425815001 1 2/3 1
754 B  1 1.0757562718 1.9362290724 0.4499692735 4.0000000000 1.0
754 C  1 3.0286050243 1.2261926627 0.8097408892 0.5000000000 1.0
754D  1 1.3796837741 2.9335184328 0.1181236232 18.000000000 1.0
755A  1 2.7886799378 1.9583126075 0.7022364169 1.0000000000 1.0
755 B  1 3.5020797733 2.8444156107 0.8122075438 1.0000000000 1.0
755 C  0 2.1787770859 1.0893885430  1  1/2  1
755D  0 4.1290425737 4.1290425737  1  1  1
755 E  0 5.0574520557 5.0574520557  1  1  1
755 F  0 0.1545463751 2.0091028768  1  13  1
756A  0 1.7063838931 1.7063838931  1  1  1
756 B  1 2.1611676117 2.0476009778 0.9474512605 1.0000000000 1.0
756 C  1 1.8177688025 2.1245818910 0.3895951799 3.0000000000 1.0
756D  0 2.0527415348 2.0527415348  1  1  1
756 E  0 2.0818495119 2.0818495119  1  1  1
756 F  0 1.2639024702 1.2639024702  1  1  1
758A  1 2.0017018367 1.2248470767 0.3059514295 2.0000000000 1.0
758 B 0 0.9266980553 3.7067922210 1 4 1
759A  1 0.8052905555 1.2941612047 1.6070736157 1.0000000000 1.0
759 B  1 1.0932448414 1.6306147760 1.4915366753 1.0000000000 1.0
760A  0 2.6248441565 2.6248441565  1  1  1
760 B  0 0.1879117839 1.3153824873  1  7  1
760 C  0 1.4515241647 2.9030483294  1  2  1
760D  1 2.7369997770 1.7874773125 0.2176930286 3.0000000000 1.0
760 E  1 2.6012959156 2.2403249976 1.7224683929 0.5000000000 1.0
762A  0 1.5128246531 1.5128246531  1  1  1
762 B  0 0.4542920018 1.8171680074  1  4  1
762 C  1 2.7594600422 1.8102970129 0.1640082648 4.0000000000 1.0
762D  1 3.6331443577 2.5474201408 0.0701161278 10.000000000 1.0
762 E  1 1.7475576222 2.9286927531 0.0253920855 66.000000000 1.0
762 F  0 0.9694108898 2.9082326695  1  3  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
762G  0 0.4859865783 2.9159194697  1  6  1
763A  1 3.2220719485 1.2429317687 0.1285851453 3.0000000000 1.0
765A  0 2.0616348322 2.0616348322  1  1  1
765 B  0 1.1759321797 1.1759321797  1  1  1
765 C  1 3.0783495607 1.5493056096 0.5032909938 1.0000000000 1.0
766A 0 2.0523827032 2.0523827032 1 1 1
768A  1 4.3656747146 1.9178228339 0.4392958613 1.0000000000 1.0
768 B  1 3.3463601247 1.8962429969 0.5666583769 1.0000000000 1.0
768 C  0 2.1726561662 2.1726561662  1  1  1
768D  0 4.7324678729 2.3662339365  1  1/2  1
768 E  0 1.5362999083 1.5362999083  1  1  1
768 F  0 2.9074554322 1.4537277161  1  1/2  1
768G  1 3.0869981951 2.3829930020 0.3859725292 2.0000000000 1.0
768H  1 2.0558814521 2.3075439492 1.1224109964 1.0000000000 1.0
770A  0 1.6305047714 1.6305047714  1  1  1
770 B  0 1.6894669604 0.5631556535  1  1/3  1
770 C  0 0.2245966433 1.1229832167  1  5  1
770D  1 1.3934589960 1.3476401147 0.2417796502 4.0000000000 1.0
770 E  1 0.7940452690 1.7753382914 2.2358149600 1.0000000000 1.0
770 F  1 1.1288970583 2.3511646469 0.5206773792 4.0000000000 1.0
770G  0 1.8601556792 1.8601556792  1  1  1
774A  0 1.0875097482 1.4500129977  1  4/3  1
774 B  0 1.5541356320 1.5541356320  1  1  1
774 C  0 0.0950910435 0.7607283478  1  8  1
774D  1 0.4431002071 1.7881748996 1.0088998329 4.0000000000 1.0
774 E  1 2.4922340340 1.5855794875 0.3181040516 2.0000000000 1.0
774 F  1 2.4512293565 2.7370287348 0.4187228636 2.6666666667 1.0
774G  1 1.7182765282 2.7922038752 0.0677084429 24.000000000 1.0
774H  0 0.4166411653 2.9164881572  1  7  1
774 I  0 0.7011646252 2.8046585008  1  4  1
775A  1 2.3905216902 2.2177911110 0.4638717817 2.0000000000 1.0
775 B  0 0.9454718718 0.9454718718  1  1  1
775 C  0 0.9912538890 3.9650155558  1  4  1
776A  1 3.7983234120 2.1229515512 0.5589180596 1.0000000000 1.0
777A  0 5.0397845548 1.2599461387  1  1/4  1
777 B  0 0.3038812313 0.6077624625  1  2  1
777 C  0 0.6617332035 1.3234664070  1  2  1
777D  1 2.8360196315 1.2399116897 1.7488055103 0.2500000000 1.0
777 E  1 0.7933334438 2.8167539819 2.8404237877 1.2500000000 1.0
777 F  1 3.7264393331 1.4653365029 0.1966134924 2.0000000000 1.0
777G  1 1.5621913918 2.1958152307 0.0702799683 20.000000000 1.0
780A  1 2.9965748479 2.0100038393 0.2235890354 3.0000000000 1.0
780 B 0 0.3205650494 1.6028252468 1 5 1
780 C  1 1.7695272041 2.3706082461 0.1116403787 12.000000000 1.0
780D  0 1.8390125650 1.8390125650  1  1  1
781A  0 0.8627373069 0.8627373069  1  1  1
781 B  1 2.8846769626 1.9767169681 0.2284157514 3.0000000000 1.0
782A  1 2.5499874086 1.4230642485 1.1161343336 0.5000000000 1.0
782 B  0 0.8576115978 2.5728347933  1  3  1
782 C  0 0.2690438605 1.8833070233  1  7  1
782D  0 3.8984248290 3.8984248290  1  1  1
782 E  0 1.1016692094 2.7541730235  1  5/2  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
784 A  1 2.3868312845 2.3969872725 1.0042550088 1.0000000000 1.0
784 B  1 1.9041961437 1.4763178646 0.2584323871 3.0000000000 1.0
784 C  0 1.3221927708 1.3221927708  1  1  1
784 D  0 1.3459764274 1.3459764274  1  1  1
784 E  0 0.7166350909 2.8665403635  1  4  1
784 F  0 2.9388051489 2.9388051489  1  1  1
784 G  0 1.6482722736 1.6482722736  1  1  1
784 H  1 2.5575309899 2.2075638093 0.4315810479 2.0000000000 1.0
784 I  1 4.1466198122 2.2889418179 0.5520018525 1.0000000000 1.0
784 J  1 1.1233153024 1.7509775464 0.3896896852 4.0000000000 1.0
786 A  1 5.0581564923 1.4518567044 0.2870327770 1.0000000000 1.0
786 B  1 3.0058818246 1.4457554465 0.2404877388 2.0000000000 1.0
786 C  1 0.3058839233 1.7237614871 2.8176725807 2.0000000000 1.0
786 D  0 0.6243670999 0.6243670999  1  1  1
786 E  0 2.2980284444 1.1490142222  1  1/2  1
786 F  0 4.1760155624 1.3920051875  1  1/3  1
786 G  1 1.5009743618 1.9166428447 1.2769324337 1.0000000000 1.0
786 H  1 2.4343976800 1.8060854772 0.0529930284 14.000000000 1.0
786 I 0 1.6451388054 2.4677082081 1 3/2 1
786 J  1 1.5930966388 2.5762182307 0.0770054092 21.000000000 1.0
786 K  1 2.1879905064 2.4916678812 0.1897988035 6.0000000000 1.0
786 L  1 2.1896861019 2.9938328080 0.0390640833 35.000000000 1.0
786M 0 1.0935574545 3.2806723636 1 3 1
790 A  1 2.7861735231 2.4402283805 0.2189587583 4.0000000000 1.0
791 A  0 2.2117095243 1.1058547621  1  1/2  1
791 B  0 0.9636216384 0.4818108192  1  1/2  1
791 C  1 2.3695463432 1.6526782132 2.7898643434 0.2500000000 1.0
792 A  1 1.4206345211 2.1984987673 1.5475470536 1.0000000000 1.0
792 B 0 1.7214809982 1.7214809982 1 1 1
792 C  1 3.2592957589 2.2026699195 0.3379058058 2.0000000000 1.0
792 D  1 2.3650528515 2.1181494566 0.8956034345 1.0000000000 1.0
792 E  0 1.0701000521 2.1402001041  1  2  1
792 F  0 0.9557592918 1.9115185836  1  2  1
792 G  0 0.9996484530 0.9996484530  1  1  1
793 A  1 2.3803932304 2.7443839416 4.6116480361 0.2500000000 1.0
794 A  2 4.3426433734 1.2945419121 0.1490499911 2.0000000000 1.0
794 B  1 4.3358043302 2.9800260413 2.0619191834 0.3333333333 1.0
794 C  1 2.0929914585 2.6163624910 0.2500117696 5.0000000000 1.0
794 D  1 0.9328062669 2.4030580639 1.2880799311 2.0000000000 1.0
795 A  1 3.5382943332 2.4330443998 1.3752639948 0.5000000000 1.0
795 B  0 0.6187438638 0.6187438638  1  1  1
795 C  0 0.9180185975 1.5300309959  1  5/3  1
795 D  0 1.5531710671 2.3297566006  1  3/2  1
797 A  1 3.2937076036 1.7511687923 0.5316709930 1.0000000000 1.0
798 A  1 3.3055085609 1.5173058616 0.4590234252 1.0000000000 1.0
798 B 0 1.6218747329 1.6218747329 1 1 1
798 C  1 2.8121213632 1.8270977124 0.1299444424 5.0000000000 1.0
798 D  1 1.3827775712 1.8586019292 0.1344107663 10.000000000 1.0
798 E  0 1.5364303383 1.5364303383  1  1  1
798 F  0 1.9304569995 1.9304569995  1  1  1
798 G  1 1.1169891799 2.5627859695 0.1529579704 15.000000000 1.0
798 H  1 1.2821112156 2.9833490048 0.0554024630 42.000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
798 I  0 1.6166094707 3.2332189414  1  2  1
799A  0 3.5646854576 1.7823427288  1  1/2  1
799 B  1 2.2398831435 1.9428746696 0.5782666759 1.5000000000 1.0
800A  1 2.3452395729 2.2273703795 1.8994821725 0.5000000000 1.0
800 B  1 3.8271616725 2.4376901920 0.3184723302 2.0000000000 1.0
800 C  1 1.3468072016 1.7318693925 1.2859074338 1.0000000000 1.0
800D  0 1.5683562272 1.5683562272  1  1  1
800 E  0 0.6216204919 1.8648614756  1  3  1
800 F  0 1.3899856760 1.3899856760  1  1  1
800G  0 2.4380769240 2.4380769240  1  1  1
800H  1 3.5069511370 2.2287681477 0.6355287144 1.0000000000 1.0
800 I  1 1.7115587321 2.0166727413 0.1963777913 6.0000000000 1.0
801A  0 0.2874283226 0.5748566451  1  2  1
801 B  0 2.5228982039 1.2614491020  1  1/2  1
801 C  1 0.9932060231 2.0400693564 0.5135060876 4.0000000000 1.0
801D  1 1.3275315217 2.7050732537 2.0376715803 1.0000000000 1.0
802A  0 2.9586860920 2.9586860920  1  1  1
802 B  0 2.7580954859 1.3790477430  1  1/2  1
804A  0 1.2181961170 1.8272941755  1  3/2  1
804 B  1 0.3920429442 2.0038536354 0.8518852612 6.0000000000 1.0
804 C  1 3.3871101427 1.8789758549 0.1849143543 3.0000000000 1.0
804D  1 1.2304488171 2.3844031579 0.0922777168 21.000000000 1.0
805A  1 0.3121746385 3.2924658901 5.2734358970 2.0000000000 1.0
805 B  0 1.3368165187 0.6684082593  1  1/2  1
805 C  0 1.1515660853 0.5757830427  1  1/2  1
805D  0 2.4472776600 4.8945553199  1  2  1
806A  1 2.4438911360 1.9545918895 0.3998934037 2.0000000000 1.0
806 B  1 1.1144535359 1.4834831912 0.6655652943 2.0000000000 1.0
806 C  1 3.0117139374 3.0094615134 0.0999252112 10.000000000 1.0
806D  1 0.7414216038 2.1907922082 0.0447705073 66.000000000 1.0
806 E  0 0.5520548375 3.3123290252  1  6  1
806 F  0 1.1935183996 2.3870367992  1  2  1
807A  0 3.1886904948 2.1257936632  1  2/3  1
808A  0 1.2470006143 1.2470006143  1  1  1
808 B  0 1.4157114782 2.8314229564  1  2  1
810A  0 3.6661316994 1.2220438998  1  1/3  1
810 B  0 1.5814478510 1.0542985673  1  2/3  1
810 C  0 0.5080077512 1.5240232535  1  3  1
810D  1 2.4563334791 1.7806753746 0.3624661288 2.0000000000 1.0
810 E  0 2.3454927808 2.3454927808  1  1  1
810 F  0 1.7955568582 2.3940758110  1  4/3  1
810G  0 1.6014313405 2.6690522342  1  5/3  1
810H  1 2.0683411935 2.8535912313 0.2299420135 6.0000000000 1.0
811A  1 1.9340514664 2.0684791373 1.0695057361 1.0000000000 1.0
812A 0 0.9323743908 2.7971231723 1 3 1
812 B  1 1.9151319254 1.9569919894 0.0851547946 12.000000000 1.0
813A 0 4.2392844940 4.2392844940 1 1 1
813 B  1 2.3320513620 2.2554368624 0.9671471646 1.0000000000 1.0
814A  1 2.2458764704 1.1895559609 1.5889867184 0.3333333333 1.0
814 B  1 4.0087531499 2.8487110366 0.1421245425 5.0000000000 1.0
815A  1 1.2781104061 1.6300946134 1.9130913171 0.6666666667 1.0
816A  1 3.2521275353 1.9819661024 0.3047183853 2.0000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
816 B  0 1.7752905638 1.7752905638  1  1  1
816 C  0 1.1027496746 1.1027496746  1  1  1
816D  0 0.8104871336 2.4314614009  1  3  1
816 E  0 0.5970685354 1.1941370708  1  2  1
816 F  0 1.9526773174 1.9526773174  1  1  1
816G  1 3.6606128038 2.0695270453 0.2826749449 2.0000000000 1.0
816H  1 0.9934818585 1.9010184804 0.9567454424 2.0000000000 1.0
816 I  1 1.5953891658 2.3777937997 0.0677461892 22.000000000 1.0
816 J  1 1.9478575653 2.3068323672 0.5921460604 2.0000000000 1.0
817A  2 3.0564514640 1.5664703894 0.2562563823 2.0000000000 1.0
817 B  1 1.0755524992 1.4907042069 0.1385989255 10.000000000 1.0
819A  1 1.9019631700 2.7129683860 2.8528085388 0.5000000000 1.0
819 B  1 4.3270924952 1.5410481142 0.7122787950 0.5000000000 1.0
819 C  0 1.9275039799 3.8550079598  1  2  1
819D  0 0.2993838632 0.5987677264  1  2  1
819 E  0 0.8373929073 1.6747858145  1  2  1
819 F  0 0.6025246471 3.6151478828  1  6  1
822A  1 1.5796960506 1.5173956623 0.4802808938 2.0000000000 1.0
822 B  0 0.4081775441 1.6327101766  1  4  1
822 C  0 1.4591472676 1.9455296901  1  4/3  1
822D  1 1.6107354638 1.8697090304 0.1160779701 10.000000000 1.0
822 E  0 2.1838655335 3.2757983002  1  3/2  1
822 F  0 1.6654990728 3.3309981457  1  2  1
825A  1 3.3747765340 1.8040304300 0.2672814647 2.0000000000 1.0
825 B  1 1.3368809093 1.7134165818 0.8544349113 1.5000000000 1.0
825 C  1 1.5092459478 2.2662910335 0.7508024245 2.0000000000 1.0
826A  0 1.3649054369 1.3649054369  1  1  1
826 B  0 0.6982483960 2.0947451879  1  3  1
827A  1 5.0436182817 1.3222292482 0.2621588658 1.0000000000 1.0
828A 0 4.1001947929 2.0500973964 1 1/2 1
828 B  1 1.2458224988 2.1792708496 1.1661751450 1.5000000000 1.0
828 C  1 1.2681978153 2.3181073582 1.8278752181 1.0000000000 1.0
828D 0 1.7429033412 1.7429033412 1 1 1
829A  1 3.4016683815 1.2057007713 0.3544439481 1.0000000000 1.0
830A 0 1.3300813679 1.7734418239 1 4/3 1
830 B  1 0.8272891182 2.7304793867 0.0257852663 128.00000000 1.0
830 C  1 2.0301023316 2.2133179782 0.0545124732 20.000000000 1.0
831A  1 2.0541939187 1.7484352839 0.0851153958 10.000000000 1.0
832A  1 2.4007898238 2.4019028404 0.2501159011 4.0000000000 1.0
832 B  1 1.3485484416 2.0036945644 0.3714539468 4.0000000000 1.0
832 C  1 1.6405548585 2.1713281808 0.3308832023 4.0000000000 1.0
832D  0 2.3913876409 1.1956938204  1  1/2  1
832 E  0 0.8369394685 1.6738789370  1  2  1
832 F  0 1.5368108334 3.0736216668  1  2  1
832G  0 1.2301336856 2.4602673712  1  2  1
832H  1 3.9630716475 2.1688159289 1.0945126012 0.5000000000 1.0
832 I  1 2.6223391999 2.4833924059 0.2367535449 4.0000000000 1.0
832 J  1 0.6378305375 1.5951492806 0.6252245646 4.0000000000 1.0
833A  0 2.0755836776 1.0377918388  1  1/2  1
834A  0 0.4778202483 1.6723708692  1  7/2  1
834 B  0 0.8593990205 1.7187980411  1  2  1
834 C  1 2.8261629299 1.8333472976 0.0810881814 8.0000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
834D  0 4.7123016890 2.3561508445  1  1/2  1
834 E  1 2.4708181999 2.7025662830 0.5468970325 2.0000000000 1.0
834 F  1 1.7964026865 2.5729930149 0.0511536797 28.000000000 1.0
834G  1 1.8880547711 3.0211249880 0.8000628568 2.0000000000 1.0
836A  1 1.2193960008 2.0763611931 0.8513892090 2.0000000000 1.0
836 B 0 1.7821670818 2.6732506227 1 3/2 1
840A  1 1.1320487150 1.9611172165 3.4647223049 0.5000000000 1.0
840 B  0 1.2212883443 1.2212883443  1  1  1
840 C  0 2.7757566445 1.3878783223  1  1/2  1
840D  0 0.3691044282 1.8455221409  1  5  1
840 E  1 2.2308313793 1.9866164430 0.8905273887 1.0000000000 1.0
840 F  1 3.7748216876 2.0729414081 2.1965979638 0.2500000000 1.0
840G 0 3.0559620739 1.5279810369 1 1/2 1
840H  1 1.6475613042 2.4547357754 0.4966402503 3.0000000000 1.0
840 I  0 1.9451617258 1.9451617258  1  1  1
840 J  0 2.1289344074 2.1289344074  1  1  1
842A  1 2.7237772439 1.4033951345 0.5152385855 1.0000000000 1.0
842 B  1 2.4004300386 2.3619845303 0.0756910698 13.000000000 1.0
843A  1 2.6718170788 2.5244694756 0.9448511635 1.0000000000 1.0
845A  0 1.4929349382 1.4929349382  1  1  1
846A  0 0.6897576384 1.3795152768  1  2  1
846 B  1 2.4931128810 1.7694946429 0.3548765594 2.0000000000 1.0
846 C  1 0.8110632878 1.6551206746 1.0203400275 2.0000000000 1.0
847A 0 0.2341098321 1.8728786567 1 8 1
847 B  1 0.9088500537 1.2780958682 0.1757847545 8.0000000000 1.0
847 C  1 0.5402177457 1.9187378840 1.1839287023 3.0000000000 1.0
848A  0 0.7199604717 1.4399209433  1  2  1
848 B  0 0.7428842336 1.4857684673  1  2  1
848 C  0 1.3433600285 2.6867200570  1  2  1
848D  0 2.5003648541 1.2501824271  1  1/2  1
848 E  0 1.5405906701 3.0811813403  1  2  1
848 F  1 1.5703419300 2.4421024255 1.5551405582 1.0000000000 1.0
848G  1 2.3425055207 1.8785649168 0.2004867118 4.0000000000 1.0
849A  1 2.0010953407 1.1472977579 0.2866674402 2.0000000000 1.0
850A  0 0.3539825981 0.7079651961  1  2  1
850 B  0 2.0105217603 2.0105217603  1  1  1
850 C  1 1.2971425667 1.9776460914 0.7623086861 2.0000000000 1.0
850D  1 0.2669383439 1.8987366857 0.5080725646 14.000000000 1.0
850 E  1 2.2753196437 1.1214812335 0.0821482553 6.0000000000 1.0
850 F  0 0.5968922828 2.3875691312  1  4  1
850G  0 1.8071584322 3.6143168644  1  2  1
850H  0 0.8549748907 3.4198995626  1  4  1
850 I  0 1.0175538788 4.0702155151  1  4  1
850 J  0 0.5974888457 1.1949776915  1  2  1
850K  1 1.4888215440 2.7115121406 0.1517706040 12.000000000 1.0
850 L  1 2.9004989556 2.7415419874 0.0675140487 14.000000000 1.0
851A  1 3.8742025615 1.4039603600 0.1811934634 2.0000000000 1.0
854A  1 2.1225419878 1.8547964065 0.4369280837 2.0000000000 1.0
854 B  1 2.7912216525 2.0035028254 3.2300418371 0.2222222222 1.0
854 C  1 2.9994943944 2.7291045757 0.1137318585 8.0000000000 1.0
854D  1 1.2693965422 2.6429141568 0.0495720017 42.000000000 1.0
855A  0 0.9424032711 0.9424032711  1  1  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
855 B  1 1.4708261859 1.6027786295 0.3632377152 3.0000000000 1.0
855 C 0 1.0322612259 2.0645224517 1 2 1
856 A  1 4.4255910442 2.4629930198 0.2782671281 2.0000000000 1.0
856 B  1 1.5228754070 2.3348898990 0.7666056882 2.0000000000 1.0
856 C  1 3.7638167988 2.0348872808 0.1351611535 4.0000000000 1.0
856 D  1 0.5234970512 2.6183951496 5.0017381060 1.0000000000 1.0
858 A 0 1.1358111272 1.1358111272 1 1 1
858 B  1 0.8964019921 1.9329491676 2.1563418918 1.0000000000 1.0
858 C  0 1.4531272382 1.4531272382  1  1  1
858 D  0 0.8847016726 1.7694033452  1  2  1
858 E  0 1.7801749731 2.6702624597  1  3/2  1
858 F  1 0.6144950596 2.5969082820 0.0384189535 110.00000000 1.0
858 G  1 2.8332583986 2.6549896366 0.0520599972 18.000000000 1.0
858 H  0 1.8422546597 1.8422546597  1  1  1
858 I  0 0.3445543329 2.7564346634  1  8  1
858 J  0 1.4366901998 2.8733803997  1  2  1
858 K  0 0.2109237587 2.9529326224  1  14  1
858 L  0 0.5152748186 3.6069237304  1  7  1
858M  0 1.7091732041 3.4183464083  1  2  1
861 A  0 1.8859710003 0.9429855001  1  1/2  1
861 B  1 0.4004425393 2.9817201838 0.4380036777 17.000000000 1.0
861 C  1 0.5198123568 1.9612976333 0.1078025070 35.000000000 1.0
861 D  1 3.0961653380 1.6446967712 0.1062408878 5.0000000000 1.0
862 A  1 2.3772088260 1.8963864630 0.3988682951 2.0000000000 1.0
862 B  1 3.7125048067 1.0545502107 0.1420267805 2.0000000000 1.0
862 C  0 2.0389535297 3.0584302946  1  3/2  1
862 D  0 1.9962060868 2.6616081157  1  4/3  1
862 E  1 1.6300467988 2.7877433020 2.1377785779 0.8000000000 1.0
862 F  1 2.7368168553 2.6102377901 0.1192186913 8.0000000000 1.0
864 A  1 3.4479342806 2.1886718012 0.3173888513 2.0000000000 1.0
864 B  1 3.2770629245 2.3652195151 0.3608749007 2.0000000000 1.0
864 C  1 1.5867673970 2.1953723773 0.2305917029 6.0000000000 1.0
864 D  0 1.6436559999 1.6436559999  1  1  1
864 E  0 0.9161205838 1.8322411676  1  2  1
864 F  0 1.0740205877 2.1480411753  1  2  1
864 G  0 1.9906657850 1.9906657850  1  1  1
864 H  0 1.0026005839 2.0052011678  1  2  1
864 I  0 0.6200860754 1.2401721508  1  2  1
864 J  1 0.9489652340 2.3079806750 0.4053504091 6.0000000000 1.0
864 K  1 1.7365551510 2.1621840308 0.6225497732 2.0000000000 1.0
864 L  1 1.8920131616 2.2253261072 0.1960280679 6.0000000000 1.0
866 A  1 2.2101758802 2.4744969079 0.8396945680 1.3333333333 1.0
867 A  1 0.6257848531 1.6987250823 0.6786378233 4.0000000000 1.0
867 B  1 2.7849176519 1.2964049615 0.4655092622 1.0000000000 1.0
867 C  1 0.5370146722 3.3192111933 3.0904287770 2.0000000000 1.0
867 D  0 0.6754417434 1.3508834868  1  2  1
867 E  0 2.2141682160 4.4283364320  1  2  1
869 A  1 3.8207898925 3.0401844953 0.3978476416 2.0000000000 1.0
869 B  1 1.9650475386 1.4849690043 0.3778455674 2.0000000000 1.0
869 C 0 1.7377151949 0.8688575975 1 1/2 1
869 D  1 1.9846117144 2.5742151775 0.2161812610 6.0000000000 1.0
870 A  1 2.3986779297 1.6315300055 0.2267262847 3.0000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
870 B  1 1.0644927048 1.9885607215 1.8680829963 1.0000000000 1.0
870 C  1 2.0189872282 2.0033437922 0.9922518400 1.0000000000 1.0
870D 0 1.5632095609 1.5632095609 1 1 1
870 E  1 2.8225873469 2.6829769303 0.3168460471 3.0000000000 1.0
870 F  1 1.2569671923 2.7740230622 0.0630547895 35.000000000 1.0
870G  0 2.5341570608 2.5341570608  1  1  1
870H  0 3.2900075814 3.2900075814  1  1  1
870 I  0 0.6243667517 3.1218337583  1  5  1
871A  0 2.5120439338 5.0240878676  1  2  1
872A  1 2.6621279676 1.8625114998 0.3498162978 2.0000000000 1.0
873A 0 2.1363788789 2.1363788789 1 1 1
873 B  1 0.7702196484 2.8470655353 3.6964332722 1.0000000000 1.0
873 C  1 0.1777801853 3.5817480649 5.0367650056 4.0000000000 1.0
873D  1 2.6074609607 1.2665575443 0.1214359067 4.0000000000 1.0
874A  0 2.3626280616 2.3626280616  1  1  1
874 B  0 0.7640162400 0.7640162400  1  1  1
874 C  1 4.3943660458 1.4639454722 0.3331414491 1.0000000000 1.0
874D  1 2.5757683247 3.1207398502 0.2423152595 5.0000000000 1.0
874 E  1 1.2290033293 2.8015532327 2.2795326635 1.0000000000 1.0
874 F 0 0.5062034509 3.5434241560 1 7 1
876A  1 1.1285506284 2.0503245410 1.8167767484 1.0000000000 1.0
876 B  1 2.3538774689 2.4725343055 0.0700272731 15.000000000 1.0
880A  1 3.1380735450 2.2742262829 1.4494410346 0.5000000000 1.0
880 B 0 3.0983312416 1.5491656208 1 1/2 1
880 C  1 0.5665638294 2.2927808355 2.6978788227 1.5000000000 1.0
880D  1 2.4941606033 1.6190601765 0.0540950255 12.000000000 1.0
880 E 0 0.3888578280 0.7777156559 1 2 1
880 F  1 1.0869015844 2.0045110340 0.4610608409 4.0000000000 1.0
880G  1 1.0122129857 2.5733079776 0.1271129700 20.000000000 1.0
880H  1 3.4266195477 1.8690062115 1.0908746568 0.5000000000 1.0
880 I  0 1.7212734487 1.7212734487  1  1  1
880 J  0 1.8425381207 2.7638071810  1  3/2  1
882A  1 1.4743501869 1.6179112815 1.6460586799 0.6666666667 1.0
882 B  0 0.7682933291 1.5365866583  1  2  1
882 C  0 0.4827121345 0.9654242689  1  2  1
882D  1 2.7923167773 1.8519608668 0.1658086290 4.0000000000 1.0
882 E  1 0.7584048118 1.6782922276 0.5532310059 4.0000000000 1.0
882 F 0 0.5029660481 3.0177962886 1 6 1
882G  1 2.2521071108 2.8881331620 0.0712452092 18.000000000 1.0
882H  1 1.0223787452 2.8863902281 0.0470535054 60.000000000 1.0
882 I  0 1.2970927845 2.5941855689  1  2  1
882 J  0 0.3024687067 3.0246870671  1  10  1
882K  0 0.8064528302 3.2258113209  1  4  1
882 L  0 0.5020150241 2.0080600965  1  4  1
885A  0 2.8904036931 2.8904036931  1  1  1
885 B  1 1.5393627999 2.5812771705 3.3536956599 0.5000000000 1.0
885 C  1 3.2915493122 2.3961058957 0.2426522860 3.0000000000 1.0
885D  1 2.0244640686 1.5083772548 0.7450748463 1.0000000000 1.0
886A  1 4.7336407225 1.5970001613 0.1686862454 2.0000000000 1.0
886 B  1 2.6526645889 1.4452458189 0.5448279534 1.0000000000 1.0
886 C 0 1.1782593182 2.3565186364 1 2 1
886D  1 0.5609213187 3.0178292399 0.1415823508 38.000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
886 E  1 3.4991428175 2.8836435055 0.1648199948 5.0000000000 1.0
888A 0 0.6337216869 0.6337216869 1 1 1
888 B  1 2.0800736558 2.4590584170 1.1821977603 1.0000000000 1.0
888 C  1 1.2894745254 2.0698576775 1.6051947027 1.0000000000 1.0
888D 0 2.6073010855 2.6073010855 1 1 1
890A  1 3.4473615420 1.7674639432 0.5127004875 1.0000000000 1.0
890 B  1 2.9585607938 1.2590202825 0.4255516010 1.0000000000 1.0
890 C 0 1.8431917777 1.8431917777 1 1 1
890D  1 4.4512040152 1.9993135464 0.4491624153 1.0000000000 1.0
890 E  1 0.8221408346 1.4484961589 0.8809294576 2.0000000000 1.0
890 F  1 1.8577167478 2.1818938580 0.0903463831 13.000000000 1.0
890G  1 1.7698498471 2.8194525619 1.5930461934 1.0000000000 1.0
890H 0 2.8880852693 2.8880852693 1 1 1
891A  1 2.3510028056 1.4926709205 0.3174540917 2.0000000000 1.0
891 B  0 1.6877732673 0.5625910891  1  1/3  1
891 C  0 1.0225312693 2.0450625386  1  2  1
891D  0 2.3923630414 2.3923630414  1  1  1
891 E  0 0.7912355109 0.7912355109  1  1  1
891 F  0 4.1487915620 1.3829305207  1  1/3  1
891G  0 0.9633519031 0.9633519031  1  1  1
891H  0 4.0505896063 4.0505896063  1  1  1
892A  0 3.1558649438 3.1558649438  1  1  1
892 B  1 3.3588715764 2.5062487345 2.2384738542 0.3333333333 1.0
892 C  1 2.6003499001 2.1454643693 0.2750225228 3.0000000000 1.0
894A  1 1.1906736040 1.5789258426 0.6630389039 2.0000000000 1.0
894 B  1 1.7191484425 1.3981098223 0.8132571846 1.0000000000 1.0
894 C 0 1.1568928656 1.9281547759 1 5/3 1
894D  1 2.5631776678 2.0563466857 0.2674215306 3.0000000000 1.0
894 E  1 0.4843074326 2.7362803060 0.1228235424 46.000000000 1.0
894 F  1 3.9572511003 2.6445527611 0.1336560503 5.0000000000 1.0
894G  1 1.4668493690 3.1291749777 0.0277047098 77.000000000 1.0
895A  1 4.9464687269 1.7538892145 0.3545740024 1.0000000000 1.0
895 B 0 1.5004138844 1.5004138844 1 1 1
896A  1 2.6873620768 2.2979189861 1.7101670117 0.5000000000 1.0
896 B  1 3.8005038960 2.2943272655 1.2073805623 0.5000000000 1.0
896 C 0 3.3322500870 1.6661250435 1 1/2 1
896D  1 4.7125132663 2.3323381619 0.9898489532 0.5000000000 1.0
897A  0 1.0302057840 1.0302057840  1  1  1
897 B  0 2.2513865211 1.1256932605  1  1/2  1
897 C  1 2.2862457182 1.2516489192 2.1898764585 0.2500000000 1.0
897D  1 0.1325510626 3.0756516640 0.7734507752 30.000000000 1.0
897 E  1 0.7081406416 1.8699514540 1.0562599259 2.5000000000 1.0
897 F  1 1.6831372042 1.6264676608 0.9663310019 1.0000000000 1.0
898A  1 3.3421121540 1.9128614257 0.5723510575 1.0000000000 1.0
898 B  0 1.5337032793 1.5337032793  1  1  1
898 C  0 2.5896817775 3.8845226663  1  3/2  1
898D  1 3.5510202364 2.7167655369 0.2550220646 3.0000000000 1.0
899A  1 3.9981065199 2.3407393199 0.5854619701 1.0000000000 1.0
899 B  0 4.6049071056 4.6049071056  1  1  1
900A  0 0.8731871573 1.7463743146  1  2  1
900 B  0 1.8812247026 1.8812247026  1  1  1
900 C  1 1.9525058408 2.3172745410 0.5934103992 2.0000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
900D  1 1.7136269959 2.3474457037 0.1141558086 12.000000000 1.0
900 E  1 1.1743738590 2.2986343680 0.3262212668 6.0000000000 1.0
900 F  0 0.7663572902 1.5327145804  1  2  1
900G  0 0.6478758022 1.9436274067  1  3  1
900H  0 1.4486943348 1.4486943348  1  1  1
901A  1 1.5965166331 1.6122697072 2.0197343064 0.5000000000 1.0
901 B  1 1.1813876044 1.9820576840 3.3554739809 0.5000000000 1.0
901 C  0 2.7871636011 0.9290545337  1  1/3  1
901D  0 0.3712575011 1.1137725033  1  3  1
901 E  1 0.8647721717 2.9384268771 0.2265280169 15.000000000 1.0
901 F  1 3.3303214003 1.3138606461 0.3945146693 1.0000000000 1.0
902A  1 0.7602202342 1.5657216063 1.0297815921 2.0000000000 1.0
902 B 0 3.7125501906 2.4750334604 1 2/3 1
903A  1 2.3072778935 2.3301434116 0.2524775427 4.0000000000 1.0
903 B 0 0.4081046798 1.6324187193 1 4 1
904A  1 3.3170381291 2.2509942877 1.3572314819 0.5000000000 1.0
905A  1 4.9675540093 3.2826026256 2.6432345734 0.2500000000 1.0
905 B 0 0.5380139112 2.6900695561 1 5 1
906A  1 0.3410288839 1.5305099601 2.2439594301 2.0000000000 1.0
906 B  1 2.3722659293 1.7692736909 0.7458159176 1.0000000000 1.0
906 C  1 1.4178407129 2.0227288128 0.7133131368 2.0000000000 1.0
906D  1 2.6185194041 1.8951624465 2.1712603430 0.3333333333 1.0
906 E  0 0.4571735518 2.2858677589  1  5  1
906 F  0 1.3091802355 2.6183604710  1  2  1
906G  1 2.2339918210 2.7197368860 0.4058112270 3.0000000000 1.0
906H  1 1.8388370165 3.1439048924 0.0310859019 55.000000000 1.0
906 I  0 3.0548337452 3.0548337452  1  1  1
909A  0 0.8230901504 1.6461803008  1  2  1
909 B  0 1.7762665291 3.5525330582  1  2  1
909 C  1 3.1448957012 2.1205886995 0.3371476992 2.0000000000 1.0
910A 0 1.0509058342 1.0509058342 1 1 1
910 B  1 2.1311572863 1.9847671663 1.3969643482 0.6666666667 1.0
910 C  1 2.6028837106 1.3176683943 1.5187021867 0.3333333333 1.0
910D  1 2.0695112831 1.8764854850 0.3022429338 3.0000000000 1.0
910 E 0 0.2537944386 1.5227666315 1 6 1
910 F  1 0.5215759252 3.0174721366 0.1051872356 55.000000000 1.0
910G  1 3.4576823605 2.1767073443 0.0629527851 10.000000000 1.0
910H  1 1.0529878541 2.7611188149 0.0257076017 102.00000000 1.0
910 I  0 3.5045156420 3.5045156420  1  1  1
910 J  0 1.5932468473 1.5932468473  1  1  1
910K  1 1.1077876976 2.5781642664 0.0664945425 35.000000000 1.0
912A  1 0.8595022649 1.9507400215 1.1348079587 2.0000000000 1.0
912 B  0 3.2036916115 1.6018458057  1  1/2  1
912 C  0 1.2142468377 2.4284936753  1  2  1
912D  0 2.3936541672 2.3936541672  1  1  1
912 E  0 1.5429736445 1.5429736445  1  1  1
912 F  1 0.9267225427 2.0970333294 1.1314245812 2.0000000000 1.0
912G  1 3.0080919221 1.9566840158 0.6504734784 1.0000000000 1.0
912H  1 1.8797316974 2.5332700532 0.2695352807 5.0000000000 1.0
912 I  1 1.7505351624 2.4090814409 0.3440492789 4.0000000000 1.0
912 J  0 1.5440087217 2.3160130825  1  3/2  1
912K  0 0.7961574782 2.3884724345  1  3  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
912 L  0 0.9591647519 1.9183295038  1  2  1
913A  0 0.7261078737 0.7261078737  1  1  1
913 B  0 2.7848137078 5.5696274157  1  2  1
914A  1 1.8616267621 1.8025054924 1.9364842933 0.5000000000 1.0
914 B  0 2.0072142904 2.0072142904  1  1  1
915A  0 0.4655714661 3.2590002627  1  7  1
915 B  1 4.3738322547 2.6130796804 1.1948696375 0.5000000000 1.0
915 C 0 1.3320394729 3.9961184186 1 3 1
915D  1 1.4688651520 1.8627134122 0.2818068856 4.5000000000 1.0
916A  0 0.8084778532 1.2127167798  1  3/2  1
916 B  0 1.0750718596 3.2252155789  1  3  1
916 C  2 3.9021255757 1.5975481506 0.1364681992 3.0000000000 1.0
916D  1 4.2153960915 2.4420882822 1.7379778051 0.3333333333 1.0
916 E  1 3.1904104520 2.1723205570 0.2269635407 3.0000000000 1.0
918A  1 1.3010831327 1.7144756707 0.6588647672 2.0000000000 1.0
918 B  1 1.4955878600 1.8094793603 0.2016463903 6.0000000000 1.0
918 C  1 0.4499146685 1.9056874752 4.2356642461 1.0000000000 1.0
918D 0 0.7550553757 1.5101107513 1 2 1
918 E  1 2.3462922188 1.7463400878 0.7442977792 1.0000000000 1.0
918 F  1 1.7651732561 1.6690879842 1.4183491437 0.6666666667 1.0
918G 0 2.3989561499 3.1986081999 1 4/3 1
918H  1 2.2570175348 2.9626885215 0.0397774668 33.000000000 1.0
918 I  1 1.7369042247 3.0516986095 1.7569757538 1.0000000000 1.0
918 J  1 0.8491152910 2.9088946006 0.3425794626 10.000000000 1.0
918K  0 0.3288423901 2.6307391207  1  8  1
918 L  0 1.5039717658 3.0079435315  1  2  1
920A  1 0.5880378493 2.4148869343 0.0684447704 60.000000000 1.0
920 B  1 2.4127978013 1.6168440738 0.0558426430 12.000000000 1.0
920 C  1 2.8080443019 2.5036279661 0.2228978336 4.0000000000 1.0
920D  1 1.4333203773 2.1460465556 0.1871569146 8.0000000000 1.0
921A 0 0.3209950628 0.6419901256 1 2 1
921 B  1 3.0340231314 2.3484673295 1.1610659648 0.6666666667 1.0
922A  0 1.9239190433 1.9239190433  1  1  1
923A  0 2.7221586012 2.7221586012  1  1  1
924A  0 0.2719911704 0.8159735113  1  3  1
924 B  1 1.2992812640 2.0082329065 0.1030432728 15.000000000 1.0
924 C  1 1.8340344156 2.0474653986 0.3721241327 3.0000000000 1.0
924D 0 0.5078494253 1.5235482760 1 3 1
924 E  1 2.9265647575 2.4104695147 0.0549101014 15.000000000 1.0
924 F  0 0.3714094030 1.8570470150  1  5  1
924G  0 2.5196994926 2.5196994926  1  1  1
924H  1 0.7490531114 2.4534577552 0.0727869394 45.000000000 1.0
925A  1 2.1906183485 2.4066435608 0.5493069029 2.0000000000 1.0
925 B  1 2.9208099321 1.8478028504 0.3163168596 2.0000000000 1.0
925 C  0 1.5623454535 1.5623454535  1  1  1
925D  0 1.6068744035 3.2137488070  1  2  1
925 E  0 2.6774308083 5.3548616166  1  2  1
926A  0 2.3944486185 3.5916729278  1  3/2  1
927A  1 0.8448400033 2.8850974564 1.7074815616 2.0000000000 1.0
928A  1 1.4888902545 2.5431935125 0.4270283698 4.0000000000 1.0
928 B  1 2.6895458659 2.0226680670 0.1880120444 4.0000000000 1.0
930A  1 1.4909281319 1.5301618707 2.0526299530 0.5000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
930 B  0 0.6265047032 0.6265047032  1  1  1
930 C  0 1.2362640714 1.2362640714  1  1  1
930 D  1 0.5179840083 1.7003818844 0.4689559791 7.0000000000 1.0
930 E  1 2.7841974936 1.5851902223 0.2846763252 2.0000000000 1.0
930 F  0 0.1346848356 1.4815331915  1  11  1
930 G  0 3.0709626286 1.5354813143  1  1/2  1
930 H  1 0.7521873500 2.0821067538 0.1845379571 15.000000000 1.0
930 I  0 1.4978178696 1.4978178696  1  1  1
930 J  0 0.9353812860 1.8707625720  1  2  1
930 K  0 0.9415552095 1.8831104190  1  2  1
930 L  0 0.7411152604 2.2233457812  1  3  1
930M  1 1.5250007887 2.7780796862 0.3036151092 6.0000000000 1.0
930 N  0 0.5072789872 3.0436739229  1  6  1
930 O  0 0.8109446204 3.2437784816  1  4  1
931 A  0 1.7334096346 5.2002289037  1  3  1
931 B  0 1.5598943009 1.5598943009  1  1  1
931 C  0 1.8757939810 1.8757939810  1  1  1
933 A  1 3.5910691959 1.8296030548 0.5094869954 1.0000000000 1.0
933 B  1 1.0684901563 2.3006452064 0.1957430894 11.000000000 1.0
934 A  1 4.3580455357 2.0713329133 0.4752894150 1.0000000000 1.0
934 B  0 2.1730807250 3.6218012083  1  5/3  1
934 C  0 1.2985913057 3.8957739172  1  3  1
935 A  1 1.8682654972 1.5708761577 0.4204103111 2.0000000000 1.0
935 B 0 1.4462050325 0.9641366883 1 2/3 1
936 A  1 2.2570695652 2.2673570478 1.0045578935 1.0000000000 1.0
936 B  0 2.1411309907 2.1411309907  1  1  1
936 C  0 0.9953703325 1.9907406649  1  2  1
936 D  0 0.5479481922 1.0958963844  1  2  1
936 E  1 1.7307793292 2.2335648552 0.6452483045 2.0000000000 1.0
936 F 0 1.0573903107 2.1147806214 1 2 1
936 G  1 2.1330121455 2.3589685594 0.5529665090 2.0000000000 1.0
936 H  1 2.4247872636 2.2877842319 0.4717494739 2.0000000000 1.0
936 I 0 1.1006671090 2.2013342180 1 2 1
938 A  1 3.6024689923 2.0114613919 0.2791781687 2.0000000000 1.0
938 B  1 0.9200292966 1.5169169330 0.3297540499 5.0000000000 1.0
938 C  1 1.7860118886 2.7904680859 0.0651000726 24.000000000 1.0
938 D 0 1.7647855022 3.5295710044 1 2 1
939 A  1 0.4879438291 1.8494900042 3.7903748214 1.0000000000 1.0
939 B  1 3.1462027883 3.0969548932 1.9686937566 0.5000000000 1.0
939 C  1 2.5507838076 1.3745564274 0.1077752198 5.0000000000 1.0
940 A  0 0.3036041233 0.9108123700  1  3  1
940 B  0 2.6935919591 2.6935919591  1  1  1
940 C  1 1.0823244188 2.5466599781 2.3529543766 1.0000000000 1.0
940 D  1 3.4473780398 2.1758274460 0.2103847640 3.0000000000 1.0
940 E  0 0.9196309029 2.7588927086  1  3  1
942 A  0 1.8983844340 1.8983844340  1  1  1
942 B  0 0.1107867230 1.7725875672  1  16  1
942 C  1 0.7173734051 3.2430106243 0.0282542066 160.00000000 1.0
942 D  1 2.8179267391 3.1731945642 0.0469197578 24.000000000 1.0
943 A 0 3.5161617758 1.7580808879 1 1/2 1
944 A  1 2.0241263360 2.5461928917 0.6289609612 2.0000000000 1.0
944 B  1 3.5140200888 2.5384601650 0.3611903320 2.0000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
944 C  1 1.7116935681 1.9540124811 0.2853916901 4.0000000000 1.0
944 D 0 2.6857753111 2.6857753111 1 1 1
944 E  2 3.4396916312 1.6216175829 0.1178606803 4.0000000000 1.0
944 F  0 2.0369179593 2.0369179593  1  1  1
944 G  0 0.7123740916 1.4247481832  1  2  1
944 H  1 0.5325676265 2.6349557864 1.2369113588 4.0000000000 1.0
944 I  1 1.3545068719 2.4534358947 0.4528282480 4.0000000000 1.0
944 J  1 1.3648615266 2.3102708075 1.6926778010 1.0000000000 1.0
944 K  1 2.9562562217 1.7643718252 0.1492066057 4.0000000000 1.0
946 A 0 2.6183705859 1.3091852930 1 1/2 1
946 B  1 1.7794979329 1.9736736156 1.6636773602 0.6666666667 1.0
946 C  0 0.3661751353 3.6617513529  1  10  1
948 A  0 1.0595880585 1.5893820878  1  3/2  1
948 B  0 1.6952296957 1.6952296957  1  1  1
948 C  0 2.0612524126 2.0612524126  1  1  1
950 A  1 1.8318889258 2.0016845509 0.5463444106 2.0000000000 1.0
950 B  0 0.4410560617 0.8821121233  1  2  1
950 C  0 1.2198252026 2.4396504053  1  2  1
950 D  0 1.5541474188 3.1082948376  1  2  1
950 E  1 2.5365493120 2.8728001790 0.1887603870 6.0000000000 1.0
954 A  1 0.7259892615 1.9067839158 1.3132314877 2.0000000000 1.0
954 B  0 1.1953320239 1.1953320239  1  1  1
954 C  0 0.6676539457 1.3353078914  1  2  1
954 D  1 1.6378943272 1.8540254793 0.2829891783 4.0000000000 1.0
954 E  1 0.8578088245 1.7557498068 1.0233922505 2.0000000000 1.0
954 F  1 1.5511785481 1.6924692457 0.5455430156 2.0000000000 1.0
954 G 0 3.1990540814 3.1990540814 1 1 1
954 H  1 2.8839207271 2.9846183138 0.0739226361 14.000000000 1.0
954 I  1 2.7048923859 3.0682460481 0.1134332022 10.000000000 1.0
954 J  1 0.6041744008 2.9240611399 0.0711729909 68.000000000 1.0
954 K  0 0.4941064717 2.9646388300  1  6  1
954 L  0 1.3885180426 2.7770360851  1  2  1
954M  0 0.8313387442 3.3253549770  1  4  1
955 A  0 1.4863405386 0.7431702693  1  1/2  1
956 A  0 1.9246145311 1.9246145311  1  1  1
957 A  0 2.1597414573 1.0798707286  1  1/2  1
960 A  1 2.7025732251 2.0503200250 1.5173095078 0.5000000000 1.0
960 B  1 3.5906720505 2.0578659516 0.5731144261 1.0000000000 1.0
960 C  0 1.7605688118 1.7605688118  1  1  1
960 D  0 0.8715629020 1.7431258040  1  2  4
960 E  0 1.1850926721 1.1850926721  1  1  1
960 F  0 1.8974006112 1.8974006112  1  1  1
960 G  0 1.9807518180 1.9807518180  1  1  1
960 H  1 2.9612986380 2.6461902538 0.5957274330 1.5000000000 1.0
960 I  0 1.1287136997 1.1287136997  1  1  1
960 J  0 1.4422113862 1.4422113862  1  1  1
960 K  1 4.9320596338 2.1856460521 1.7726031024 0.2500000000 1.0
960 L  1 1.7061708770 2.5949647962 1.5209290178 1.0000000000 1.0
960M  1 2.3059156871 2.5176290280 1.0918131318 1.0000000000 1.0
960 N  0 2.2484039196 2.2484039196  1  1  4
960 O  0 0.8191069172 2.4573207515  1  3  1
960 P  0 1.9775352502 1.9775352502  1  1  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
962A  0 2.7999393875 2.7999393875  1  1  1
964A  0 1.1198415821 1.1198415821  1  1  1
965A  0 4.0716220074 2.0358110037  1  1/2  1
966A  1 0.8853869237 1.4614322919 0.8253071357 2.0000000000 1.0
966 B 0 0.2819418097 1.4097090486 1 5 1
966 C  1 0.5664715755 1.7653369522 1.5581867021 2.0000000000 1.0
966D  1 1.7441234008 1.3761745479 0.3945175402 2.0000000000 1.0
966 E  1 1.9082662943 2.0669379979 0.2707874163 4.0000000000 1.0
966 F 0 0.4082792341 1.6331169366 1 4 1
966G  1 1.1385943933 2.7656988559 0.6072616535 4.0000000000 1.0
966H  0 0.4792307183 2.3961535917  1  5  1
966 I  0 0.4643098624 2.7858591746  1  6  1
966 J  0 0.3992807787 3.5935270082  1  9  1
966K  0 2.7119467172 2.7119467172  1  1  1
968A  1 1.6556466339 2.6417815152 0.1994523968 8.0000000000 1.0
968 B  0 0.3816352236 2.2898113418  1  6  1
968 C  0 0.6021890261 2.4087561044  1  4  1
968D  1 3.0267578391 2.5010482433 0.4131563171 2.0000000000 1.0
968 E  1 0.4991290115 1.4384836253 0.3602484508 8.0000000000 1.0
969A  0 2.9869009292 2.9869009292  1  1  1
970A  0 0.5310141996 0.5310141996  1  1  1
970 B  0 1.5883427578 1.5883427578  1  1  1
972A  0 1.6050978266 1.6050978266  1  1  1
972 B  0 2.0222965389 2.0222965389  1  1  1
972 C  1 2.9166563143 2.3761866009 0.8146954406 1.0000000000 1.0
972D  1 2.3149516507 2.3144639469 0.9997893244 1.0000000000 1.0
973A 0 4.8789961045 4.8789961045 1 1 1
973 B  1 4.1607442392 2.4129023423 5.2192876639 0.1111111111 1.0
974A  0 1.2046434315 1.2046434315  1  1  1
974 B  0 0.2422921289 0.2422921289  1  1  1
974 C  0 2.1052734500 1.0526367250  1  1/2  1
974D  0 2.2001897331 2.2001897331  1  1  1
974 E  1 4.1853626672 2.8758677503 0.2290417007 3.0000000000 1.0
974 F  1 3.1291701195 2.8497837722 0.1011906126 9.0000000000 1.0
974G  1 2.4046637022 2.3325867716 0.3233420637 3.0000000000 1.0
974H  1 1.4607794760 2.1312789050 0.0972667419 15.000000000 1.0
975A  1 1.7990725603 2.6002925141 1.4453516615 1.0000000000 1.0
975 B  1 1.1088014849 1.1952547420 0.2694925012 4.0000000000 1.0
975 C  0 0.8069461169 1.6138922337  1  2  1
975D  0 0.3611376073 0.7222752146  1  2  1
975 E  0 0.4098572926 0.8197145851  1  2  1
975 F  1 1.1032705873 1.8832551063 0.8534874073 2.0000000000 1.0
975G 0 1.4788241842 1.4788241842 1 1 1
975H  1 0.9164687672 3.1593865372 0.5745579573 6.0000000000 1.0
975 I  1 0.9486309445 1.4720753967 0.0184736827 84.000000000 1.0
975 J  1 2.4669880308 2.3914244965 0.0969370125 10.000000000 1.0
975K  1 1.8043863715 1.8568392911 0.0571705373 18.000000000 1.0
976A  0 1.4719422687 2.9438845375  1  2  1
976 B  0 0.9972054784 1.9944109568  1  2  1
976 C  1 1.8569859777 2.2379967092 1.2051769567 1.0000000000 1.0
978A  0 1.0617344731 1.0617344731  1  1  1
978 B  0 2.7212716532 1.3606358266  1  1/2  1

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
978 C  0 0.1241533014 0.2483066027  1  2  1
978D  0 0.7283045343 0.7283045343  1  1  1
978 E  1 4.1996664677 1.9268524917 0.2294054190 2.0000000000 1.0
978 F  1 2.5393784966 2.8120225559 0.0503348387 22.000000000 1.0
978G  1 1.6105329585 3.2537064683 0.0360761951 56.000000000 1.0
978H  0 3.1205326016 3.1205326016  1  1  1
979A  0 2.3873792165 2.3873792165  1  1  1
979 B  1 0.4339769970 3.3551350704 2.5770452456 3.0000000000 1.0
980A  0 1.9162261352 1.9162261352  1  1  1
980 B  0 0.5248079970 0.5248079970  1  1  1
980 C  1 1.7233973087 2.5976248754 0.7536349460 2.0000000000 1.0
980D  1 1.0078659084 2.0479221272 0.1693282567 12.000000000 1.0
980 E  0 0.6921975851 1.3843951703  1  2  1
980 F  0 0.1605835588 1.4452520290  1  9  1
980G  0 1.7191073020 2.5786609530  1  3/2  1
980H  0 3.1333036925 3.1333036925  1  1  1
980 I  0 0.4067815814 0.8135631628  1  2  1
981A  1 1.5965483661 2.9392815103 0.9205112644 2.0000000000 1.0
981 B  1 3.4310796281 1.4755066121 0.2150207474 2.0000000000 1.0
982A  1 3.2102819765 1.9893672757 0.3098430746 2.0000000000 1.0
984A  0 1.0445702608 1.0445702608  1  1  1
984 B  0 0.4869816017 1.9479264069  1  4  1
984 C  1 1.2706245285 1.9979012463 0.2620628939 6.0000000000 1.0
984D  1 2.2574282587 2.6460535196 0.1953589968 6.0000000000 1.0
985A 0 0.7767573734 2.3302721201 1 3 1
985 B  1 3.1840958685 1.0139872562 0.0796134364 4.0000000000 1.0
986A 0 1.4557074439 0.9704716293 1 2/3 1
986 B  1 0.2363375503 1.6316897708 1.7260162095 4.0000000000 1.0
986 C  1 1.9736513369 2.1668844307 1.0979063983 1.0000000000 1.0
986D  1 2.2888169878 3.2671750193 0.1784314253 8.0000000000 1.0
986 E  1 0.4067622872 2.6151822165 0.0918466316 70.000000000 1.0
986 F  1 2.6487806372 3.0414018081 0.1435283921 8.0000000000 1.0
987A  0 2.1704014659 2.1704014659  1  1  1
987 B  0 1.7012497719 0.8506248859  1  1/2  1
987 C  0 2.9294495045 2.9294495045  1  1  1
987D  0 0.6856950713 4.7998654990  1  7  1
987 E  1 0.6097264187 1.7241936701 0.1885210172 15.000000000 1.0
988A 0 1.0584031179 3.1752093536 1 3 1
988 B  1 0.2075922181 2.4883343573 0.3073498884 39.000000000 1.0
988 C  1 1.9393544817 2.2502125023 0.1933815713 6.0000000000 1.0
988D  0 1.0820810042 1.0820810042  1  1  1
989A  0 4.0825015085 4.0825015085  1  1  1
990A  1 3.6418359797 1.7927380911 0.2461310862 2.0000000000 1.0
990 B  0 1.4891045559 0.9927363706  1  2/3  1
990 C  0 0.5287307010 1.0574614021  1  2  1
990D  0 1.1688028795 1.1688028795  1  1  1
990 E  1 0.9415811183 1.7973283849 1.9088407255 1.0000000000 1.0
990 F  0 1.2550458447 1.2550458447  1  1  1
990G  0 0.1953396646 1.5627173170  1  8  1
990H  1 0.8123963142 3.0762047385 0.6310968930 6.0000000000 1.0
990 I 0 1.4030386758 2.8060773515 1 2 1
990 J  1 1.7426021642 3.0722751578 0.4407596899 4.0000000000 1.0

Curve r  Ω  L^{(r)}(1)/r!  R  L^{(r)}(1)/r!ΩR  S
990K  0 1.3965264783 2.7930529567  1  2  1
990 L  0 0.4490143433 3.1431004032  1  7  1
994A  1 3.3666422532 2.0603062005 0.3059882883 2.0000000000 1.0
994 B  0 0.8538300680 0.8538300680  1  1  1
994 C  0 0.5412944368 1.6238833103  1  3  1
994D  1 1.0902271710 2.1101578430 2.9032818559 0.6666666667 1.0
994 E 0 4.6778604868 2.3389302434 1 1/2 1
994 F  1 2.4540446205 3.0834509733 0.6282385715 2.0000000000 1.0
994G  1 0.9475612683 2.6207661260 1.8438674899 1.5000000000 1.0
995A 0 3.0420956800 1.5210478400 1 1/2 1
995 B  1 3.7214583261 2.5126961150 2.0255737629 0.3333333333 1.0
996A 0 1.4835654563 2.2253481845 1 3/2 1
996 B  1 0.5549429367 2.5867487904 0.1195202023 39.000000000 1.0
996 C  1 2.5646016409 2.5309557847 0.9868806696 1.0000000000 1.0
997A  1 4.9334464641 1.2116129751 0.2455915928 1.0000000000 1.0
997 B  2 3.1532626948 1.8005737283 0.5710192593 1.0000000000 1.0
997 C  2 4.8868977083 1.2202850721 0.2497054665 1.0000000000 1.0
999A  1 0.8267057148 2.9754511153 3.5991660178 1.0000000000 1.0
999 B  1 4.9408397836 1.5561970558 0.3149661037 1.0000000000 1.0